
\input aa.cmm
%
\begtabfull
\tabcap{4}{Observations and residuals of HD 23439B}
\halign{# \hfil \quad &&\hfil # \hfil \cr
   \noalign{\medskip}
   \noalign{\hrule}
   \noalign{\medskip}
HJD      & $V_r$  & $\sigma_V$& O-C &  Inst \cr
-2 440 000  &  km/s  &   km/s &   km/s &       \cr
   \noalign{\medskip}
   \noalign{\hrule}
   \noalign{\medskip}
7924.178 &  61.44 &   0.67 &  -0.60 &   RVM \cr
8113.548 &  42.37 &   0.31 &  -0.01 &   RVM \cr
8154.524 &  43.18 &   0.51 &  -1.73 &   RVM \cr
8166.499 &  62.36 &   0.34 &   0.17 &   RVM \cr
8167.551 &  62.15 &   0.42 &   0.20 &   RVM \cr
8169.545 &  60.48 &   0.43 &   0.40 &   RVM \cr
8170.526 &  58.77 &   0.35 &  -0.40 &   RVM \cr
8171.579 &  57.64 &   0.24 &  -0.65 &   RVM \cr
8174.479 &  56.02 &   0.40 &  -0.26 &   RVM \cr
8175.447 &  55.75 &   0.20 &   0.03 &   RVM \cr
8210.467 &  42.87 &   0.48 &   0.72 &   RVM \cr
8288.210 &  48.66 &   0.37 &  -0.82 &   RVM \cr
8842.549 &  41.71 &   0.53 &  -0.35 &   RVM \cr
8850.549 &  59.48 &   0.29 &  -0.68 &   RVM \cr
8856.530 &  56.05 &   0.39 &   0.32 &   RVM \cr
5970.638 &  42.52 &   0.33 &   0.11 &   COR \cr
5977.623 &  62.75 &   0.35 &   0.47 &   COR \cr
5978.618 &  62.05 &   0.33 &   0.34 &   COR \cr
6395.477 &  47.29 &   0.47 &  -0.60 &   COR \cr
6402.463 &  45.08 &   0.34 &  -0.12 &   COR \cr
6725.572 &  51.49 &   0.33 &  -0.03 &   COR \cr
6733.539 &  48.94 &   0.31 &   0.19 &   COR \cr
6776.406 &  50.95 &   0.34 &   0.21 &   COR \cr
6883.297 &  47.66 &   0.44 &   0.24 &   COR \cr
7457.587 &  51.21 &   0.33 &   0.50 &   COR \cr
7530.358 &  43.48 &   0.33 &   0.26 &   COR \cr
7565.350 &  47.08 &   0.34 &   0.01 &   COR \cr
7857.479 &  47.06 &   0.33 &   0.08 &   COR \cr
7880.382 &  57.89 &   0.33 &   0.13 &   COR \cr
8242.423 &  48.55 &   0.34 &   0.05 &   COR \cr
8325.273 &  53.99 &   0.34 &   0.19 &   COR \cr
8465.623 &  56.65 &   0.32 &  -0.11 &   COR \cr
8470.618 &  54.11 &   0.40 &   0.04 &   COR \cr
8503.644 &  43.84 &   0.30 &  -0.13 &   COR \cr
8506.557 &  60.97 &   0.38 &  -0.57 &   COR \cr
8648.278 &  42.18 &   0.33 &   0.05 &   COR \cr
8649.275 &  43.40 &   0.34 &   0.22 &   COR \cr
8650.348 &  47.22 &   0.34 &  -0.21 &   COR \cr
8652.276 &  61.05 &   0.35 &   0.14 &   COR \cr
8652.328 &  60.99 &   0.32 &  -0.09 &   COR \cr
8653.261 &  61.75 &   0.37 &  -0.53 &   COR \cr
8654.331 &  62.06 &   0.32 &   0.34 &   COR \cr
8655.279 &  60.82 &   0.38 &   0.00 &   COR \cr
   \noalign{\medskip}
   \noalign{\hrule}
}
\endtab

%
\begtabfull
\tabcap{5}{Observations and residuals of HD 237287}
\halign{# \hfil \quad &&\hfil # \hfil \cr
   \noalign{\medskip}
   \noalign{\hrule}
   \noalign{\medskip}
HJD      & $V_r$  & $\sigma_V$& O-C &  Inst \cr
-2 440 000  &  km/s  &   km/s &   km/s &       \cr
   \noalign{\medskip}
   \noalign{\hrule}
   \noalign{\medskip}
   6726.631  & 49.51  &  0.37  &   0.03  & RVM \cr
   7564.284  & 44.13  &  0.21  &  -0.25  & RVM \cr
   7776.562  & 39.27  &  0.31  &   0.25  & RVM \cr 
   7882.402  & 43.47  &  0.32  &  -0.32  & RVM \cr
   7791.581  & 34.66  &  0.28  &   0.12  & RVM \cr
   8113.558  & 34.84  &  0.25  &  -0.33  & RVM \cr
   8149.574  & 38.40  &  0.34  &  -0.47  & RVM \cr
   8166.536  & 41.44  &  0.37  &   0.74  & RVM \cr
   8169.600  & 40.73  &  0.23  &  -0.25  & RVM \cr
   8174.483  & 41.29  &  0.28  &  -0.09  & RVM \cr
   8210.482  & 44.02  &  0.32  &   0.36  & RVM \cr
   8253.356  & 45.51  &  0.23  &  -0.01  & RVM \cr
   8279.232  & 46.15  &  0.17  &  -0.30  & RVM \cr
   9016.266  & 48.63  &  0.26  &   0.26  & RVM \cr
   5611.643  & 46.00  &  0.29  &   0.33  & COR \cr
   5968.656  & 46.71  &  0.29  &   0.12  & COR \cr
   6313.658  & 46.95  &  0.30  &  -0.11  & COR \cr
   6725.583  & 49.60  &  0.30  &   0.15  & COR \cr
   6733.571  & 49.90  &  0.29  &   0.29  & COR \cr
   7239.314  & 44.67  &  0.32  &   0.03  & COR \cr
   7458.616  & 34.44  &  0.32  &   0.09  & COR \cr
   7530.375  & 42.98  &  0.29  &   0.38  & COR \cr
   7561.385  & 44.08  &  0.29  &  -0.17  & COR \cr
   7858.618  & 42.20  &  0.28  &  -0.24  & COR \cr
   7880.427  & 44.10  &  0.29  &   0.41  & COR \cr
   7974.354  & 47.45  &  0.32  &   0.16  & COR \cr
   8121.640  & 34.27  &  0.31  &  -0.20  & COR \cr
   8124.654  & 35.05  &  0.30  &   0.18  & COR \cr
   8126.653  & 35.43  &  0.30  &   0.24  & COR \cr
   8229.579  & 44.38  &  0.30  &  -0.18  & COR \cr
   8328.342  & 47.87  &  0.29  &  -0.15  & COR \cr
   8471.630  & 37.53  &  0.30  &  -0.13  & COR \cr
   8539.683  & 43.76  &  0.32  &   0.18  & COR \cr
   8653.343  & 47.42  &  0.28  &  -0.43  & COR \cr
   8664.303  & 48.64  &  0.28  &   0.46  & COR \cr
   8748.347  & 48.21  &  0.41  &  -0.52  & COR \cr
   8753.328  & 47.91  &  0.39  &   0.15  & COR \cr
   8962.472  & 46.82  &  0.32  &  -0.35  & COR \cr  
   \noalign{\medskip}
   \noalign{\hrule}
}
\endtab


%
\begtabfull
\tabcap{6}{Observations and residuals of HD 217580. 
The RVM velocities have been increased by 0.4 km/s}
\halign{# \hfil \quad &&\hfil # \hfil \cr
   \noalign{\medskip}
   \noalign{\hrule}
   \noalign{\medskip}
HJD      & $V_r$  & $\sigma_V$& O-C &  Inst \cr
-2 440 000  &  km/s  &   km/s &   km/s &       \cr
   \noalign{\medskip}
   \noalign{\hrule}
   \noalign{\medskip}
6277.528 & -45.26 &   0.21 &  -0.29 &   RVM \cr
6632.558 & -44.12 &   0.26 &  -0.33 &   RVM \cr
6646.451 & -44.25 &   0.23 &  -0.32 &   RVM \cr
6727.352 & -45.18 &   0.35 &  -0.28 &   RVM \cr
7003.542 & -42.80 &   0.46 &   0.26 &   RVM \cr
7019.533 & -43.19 &   0.12 &  -0.01 &   RVM \cr
7561.078 & -44.01 &   0.28 &  -0.02 &   RVM \cr
7744.518 & -47.68 &   0.25 &  -0.56 &   RVM \cr
7745.534 & -46.76 &   0.20 &   0.39 &   RVM \cr
7753.544 & -47.18 &   0.23 &   0.21 &   RVM \cr
7775.461 & -47.90 &   0.26 &  -0.03 &   RVM \cr
7791.392 & -47.51 &   0.21 &  -0.06 &   RVM \cr
7882.137 & -42.76 &   0.20 &   0.15 &   RVM \cr
8076.544 & -45.19 &   0.21 &  -0.49 &   RVM \cr
8083.542 & -44.26 &   0.20 &   0.53 &   RVM \cr
8105.513 & -44.77 &   0.21 &   0.33 &   RVM \cr
8116.467 & -44.97 &   0.32 &   0.31 &   RVM \cr
8149.393 & -46.41 &   0.17 &  -0.54 &   RVM \cr
8166.367 & -45.98 &   0.23 &   0.26 &   RVM \cr
8210.302 & -47.23 &   0.31 &   0.22 &   RVM \cr
8243.110 & -47.89 &   0.25 &  -0.27 &   RVM \cr
8243.116 & -47.28 &   0.29 &   0.34 &   RVM \cr
8245.085 & -47.46 &   0.58 &   0.05 &   RVM \cr
8248.099 & -47.04 &   0.25 &   0.26 &   RVM \cr
8252.136 & -46.07 &   0.51 &   0.87 &   RVM \cr
8252.147 & -47.88 &   0.29 &  -0.94 &   RVM \cr
8252.157 & -47.08 &   0.26 &  -0.14 &   RVM \cr
8263.128 & -45.32 &   0.37 &   0.37 &   RVM \cr
8263.132 & -45.63 &   0.23 &   0.06 &   RVM \cr
8269.113 & -44.31 &   0.28 &   0.70 &   RVM \cr
8269.118 & -44.69 &   0.35 &   0.32 &   RVM \cr
8279.079 & -45.05 &   0.25 &  -0.94 &   RVM \cr
8458.559 & -43.87 &   0.17 &   0.00 &   RVM \cr
8459.561 & -43.67 &   0.37 &   0.21 &   RVM \cr
8492.470 & -43.98 &   0.23 &   0.25 &   RVM \cr
8840.530 & -43.05 &   0.17 &   0.15 &   RVM \cr
8938.239 & -43.69 &   0.51 &   0.44 &   RVM \cr
5614.413 & -42.65 &   0.28 &   0.28 &   COR \cr
5916.622 & -47.15 &   0.28 &  -0.30 &   COR \cr
5933.621 & -47.34 &   0.27 &   0.01 &   COR \cr
5969.422 & -47.44 &   0.32 &   0.20 &   COR \cr
6277.572 & -44.77 &   0.29 &   0.20 &   COR \cr
6313.562 & -45.52 &   0.28 &   0.02 &   COR \cr
6377.398 & -46.91 &   0.32 &   0.12 &   COR \cr
6396.267 & -47.21 &   0.27 &   0.37 &   COR \cr
6648.605 & -43.83 &   0.28 &   0.13 &   COR \cr
6704.435 & -44.62 &   0.29 &  -0.03 &   COR \cr
   \noalign{\medskip}
   \noalign{\hrule}
}
\endtab
%
%
\begtabfull
%\tabcap{6}{Continued}
\halign{# \hfil \quad &&\hfil # \hfil \cr
% \noalign{\medskip}
   \noalign{\medskip}
   \noalign{\medskip}
   \noalign{\medskip}
   \noalign{\medskip}
   \noalign{\medskip}
   \noalign{\medskip}
   \noalign{\hrule}
   \noalign{\medskip}
HJD      & $V_r$  & $\sigma_V$& O-C &  Inst \cr
-2 440 000  &  km/s  &   km/s &   km/s &       \cr
   \noalign{\medskip}
   \noalign{\hrule}
   \noalign{\medskip}
6724.399 & -44.51 &   0.29 &   0.35 &   COR \cr
7004.597 & -43.33 &   0.30 &  -0.26 &   COR \cr
7037.550 & -43.48 &   0.29 &  -0.15 &   COR \cr
7147.283 & -44.21 &   0.29 &   0.24 &   COR \cr
7352.601 & -46.10 &   0.29 &  -0.27 &   COR \cr
7397.507 & -42.87 &   0.28 &   0.18 &   COR \cr
7416.494 & -43.11 &   0.29 &  -0.20 &   COR \cr
7424.455 & -42.68 &   0.30 &   0.23 &   COR \cr
7457.410 & -43.49 &   0.30 &  -0.43 &   COR \cr
7738.603 & -47.17 &   0.33 &  -0.22 &   COR \cr
7854.276 & -42.95 &   0.32 &   0.07 &   COR \cr
8094.615 & -45.18 &   0.28 &  -0.24 &   COR \cr
8141.520 & -45.86 &   0.29 &  -0.14 &   COR \cr
8230.244 & -48.31 &   0.29 &  -0.44 &   COR \cr
8505.513 & -44.54 &   0.29 &  -0.16 &   COR \cr
   \noalign{\medskip}
   \noalign{\hrule}
 \noalign{\medskip}
% \noalign{\medskip}
}
\endtab
%
\end

