This article was processed by the author using Springer-Verlag L^ATEX A&A style file L-AA version 3.

Table 1. Table of longitudinal magnetic field measurements. Columns 1, 2 and 3 indicate the number, HJD and phase (with P = 3.638833 d) of each measurement respectively. Columns 4 and 5 give the longitudinal field measurement and its error bar. Columns 6 and 7 give the null polarisation and its error bar.

# HJD Ph B σB N σN # HJD Ph B σB N σN # HJD Ph B σB N σN 1 0.43 0.113 354 134 117 128 40 355.56 0.707 81 221 66 219 77 361.43 0.320 −149 167 67 165 2 0.55 0.146 68 140 −254 134 41 355.58 0.714 −309 235 −461 234 78 361.45 0.327 −126 174 116.9 170 3 5.40 0.479 −333 152 86 148 42 356.44 0.949 −3 185 −219 182 79 361.47 0.333 32 167 −164 164 4 5.43 0.489 3 144 −263 140 43 356.46 0.955 72 167 −238 167 80 361.50 0.339 −145 167 −194 165 5 5.48 0.500 −1 164 224 161 44 356.48 0.961 195 197 −282 194 81 361.52 0.345 61 172 17 170 6 5.52 0.512 −333 200 477 196 45 356.51 0.968 19 184 −61 182 82 364.37 0.130 110 224 −245 224 7 5.56 0.522 −475 206 202 203 46 356.53 0.974 244 193 −145 191 83 364.40 0.136 −152 252 75 252 8 6.40 0.752 −102 190 −150 187 47 356.55 0.980 −298 198 159 194 84 364.42 0.142 4 247 140 246 9 6.43 0.762 230 202 −102 202 48 356.57 0.986 −108 170 −80 168 85 364.44 0.149 217 218 128 217 10 6.47 0.773 214 210 208 207 49 357.43 0.221 42 167 −23 164 86 364.47 0.155 −487 261 −550 264 11 6.51 0.783 176 248 −272 248 50 357.45 0.227 −57 176 11 171 87 364.49 0.161 −246 294 −216 291 12 6.54 0.793 −457 355 174 355 51 357.47 0.234 226 172 −95 169 88 364.51 0.168 −108 296 37 293 13 6.59 0.805 204 296 −123 297 52 357.50 0.240 609 170 107 168 89 365.37 0.402 −98 188 227 190 14 10.38 0.847 115 218 48 216 53 357.52 0.246 313 167 20 165 90 365.39 0.409 −172 183 −263 182 15 10.41 0.857 550 221 −64 218 54 357.54 0.251 68 173 −126 169 91 365.41 0.415 162 186 −77 182 16 10.45 0.867 −437 195 3 193 55 358.38 0.483 −492 208 −222 207 92 365.44 0.422 60 184 40 180 17 13.47 0.697 13 138 −24 136 56 358.40 0.489 −6 214 40 215 93 365.46 0.428 −46 200 147 197 18 13.50 0.706 −38 142 −131 138 57 358.43 0.495 −556 229 −460 228 94 365.48 0.435 −60 188 −102 187 19 13.55 0.718 94 174 −171 175 58 358.45 0.502 −139 206 −284 204 95 365.51 0.441 −389 191 193 186 20 13.59 0.729 74 221 163 222 59 358.47 0.508 −196 224 380 221 96 366.37 0.679 −330 224 −96 221 21 17.38 0.771 7 240 69 237 60 358.51 0.518 −271 204 −109 200 97 366.39 0.684 −404 259 318 259 22 17.44 0.787 51 192 −104 191 61 358.54 0.525 −163 223 7 222 98 366.42 0.691 40 216 227 215 23 17.48 0.798 −323 198 172 195 62 359.37 0.755 81 226 256 230 99 366.44 0.698 −317 247 265 244 24 17.52 0.808 −411 208 −37 202 63 359.39 0.761 −36 196 −159 195 100 366.46 0.704 −155 261 218 260 25 17.55 0.818 −272 216 88 215 64 359.42 0.767 239 192 −176 193 101 366.49 0.711 398 262 218 263 26 350.44 0.301 1194 436 559 437 65 359.46 0.780 128 200 −102 199 102 367.37 0.954 −66 263 340 262 27 350.47 0.308 −380 375 170 373 66 359.49 0.786 428 166 −188 163 103 367.40 0.960 168 282 76 280 29 350.52 0.322 −89 289 177 287 67 359.51 0.793 199 189 −171 188 104 367.42 0.967 87 264 96 262 30 350.54 0.329 −374 299 217 294 68 359.53 0.799 44 186 −131 183 105 367.44 0.973 −177 235 −50 229 31 350.57 0.335 0 313 206 312 69 360.39 0.035 −79 266 8 261 106 367.47 0.980 172 198 269 198 32 351.52 0.598 −390 290 330 290 70 360.41 0.041 263 242 −76 240 107 367.49 0.986 −40 262 250 265 33 351.54 0.604 −234 272 126 273 71 360.43 0.047 18 226 227 226 108 367.51 0.993 122 219 6 217 34 353.60 0.168 21 227 −211 228 72 360.46 0.053 289 242 652 238 109 368.42 0.242 −212 212 21 211 35 353.62 0.174 −79 244 114 243 73 360.48 0.059 −140 224 8 222 110 368.45 0.249 40 197 12 198 36 353.64 0.180 −312 402 −406 402 74 360.50 0.065 −185 234 133 231 111 368.47 0.255 −10 168 −103 164 37 355.48 0.686 −398 257 204 255 75 361.38 0.308 −5 184 −252 181 112 368.49 0.261 −332 185 259 184 38 355.50 0.692 −81 239 −592 236 76 361.41 0.314 171 170 −135 166 113 368.51 0.268 −195 231 225 228 39 355.53 0.700 −172 225 112 222