This article was processed by the author using Springer-Verlag

LATEX A&A style file L-AA version 3.

Table 1. ISOCAM sources with mid-IR excesses.

height ISO-CrA RA(1950) DEC(1950) F(6.7), Jy F(14.3), Jy F(14.3)/F(6.7) Source id.

height 13 18:55:33.2 -37:11:45 0.144 0.065 0.45

55 18:56:21.0 -37:08:10 0.0040 0.0052 1.30 76 18:56:52.9 -37:02:09 0.0032 0.0058 1.81 83 18:56:58.2 -37:08:55 0.0106 0.0145 1.37 88 18:57:06.4 -37:00:17 0.0176 0.0081 0.46 GPg2, R9 110 18:57:40.2 -37:07:55 0.184 0.161 0.88 HR 7169, R5 116 18:57:46.4 -37:01:37 4.66 6.15 1.32 SCrA, VSS3, R8 127 18:57:55.6 -37:02:47 0.031 0.030 0.98 134 18:58:03.0 -37:03:39 0.139 0.077 0.55 VSS18, W97-2-2 135 18:58:04.2 -37:03:26 0.0149 Gpe2, W97-2-3, R7 139 18:58:09.5 -37:02:25 0.0106 0.0040 0.38 IRS14, W97-1-12 140 18:58:47.4 -37:01:08 0.0080 W97-1-79 143 18:58:50.6 -37:07:30 0.0041 0.0046 1.12 W97-1-83 145 18:58:52.2 -37:04:54 0.0112 0.0092 0.82 W97-1-89 155 18:59:04.9 -37:02:33 0.167 0.139 0.83 Hff14, W97-2-24 159 18:59:10.6 -37:02:45 0.233 0.181 0.77 Hff3 177 18:59:32.7 -36:50:45 0.0107 0.0073 0.68 182 18:59:36.1 -37:11:59 0.0249 0.106 4.27 iras32c 185 18:59:38.5 -37:12:16 0.0148 0.0121 0.82 iras32d 198 18:59:46.9 -37:01:46 0.062 0.034 0.55 201 18:59:48.8 -37:13:27 0.0060 0.008 1.33 height

Table 2. YSOs without detected mid-IR excesses.

height ISO-CrA RA(1950) DEC(1950) F(6.7), Jy F(14.3), Jy F(14.3)/F(6.7) Source id.

46 18:56:09.2 -36:54:38 0.0147 R13(?) 94 18:57:16.9 -36:52:27 0.0092 R14 111 18:57:41.4 -37:07:59 0.2215 0.0594 0.27 HR 7170 118 18:57:47.6 -36:52:05 0.0364 0.0063 0.17 GPf2, R15 151 18:59:00.1 -37:00:03 0.0266 0.0065 0.24 GPw, R10, W97-99 height