HS 0946+4845 z=0.590

4000 5000 6000 [Å] Wavelength

0123[10e-16]

Flux

HS 0947+4904 z=0.612

4000 5000 6000 7000 [Å] Wavelength

0.51[10e-16]

HS 1623+7313 z=0.621

4000 5000 6000 [Å] Wavelength

02468[10e-16]

HS 1244+4750 z=0.627

4000 5000 6000 [Å] Wavelength

123[10e-16]

HS 0135+0908 z=0.659

4000 5000 6000 [Å] Wavelength

12345[10e-16]

HS 0845+2757 z=0.667

4000 5000 6000 [Å] Wavelength

01234[10e-16]

HS 0944+4725 z=0.703

4000 5000 6000 7000 [Å] Wavelength

HS 1242+3412 z=0.717

4000 5000 6000 [Å] Wavelength

123[10e-3]

HS 0942+5008 z=0.756

4000 5000 6000 [Å] Wavelength

0.51[10e-15]

HS 0957+4844 z=0.785

4000 5000 6000 7000 [Å] Wavelength

0.51.5[10e-16]

HS 0954+4815 z=0.829

4000 5000 6000 7000 [Å] Wavelength

012[10e-16]

HS 0936+4606 z=0.834

4000 5000 6000 [Å] Wavelength

1234567Flux