Table 1: List of known members in Cha I with IR excess.

ISO α(2000) δ(2000) I J K_s F_{6.7} F_{14.3} Id. Ref.Id. ChaI h m s ffi^0 ” mag. mag. mag. (mJy) (mJy) 3 11 02 25.0 -77 33 36 10.12 9.00 8.26 47.3(1.2) 21.6(1.8) CSCha 1 4* 11 02 33.0 -77 29 14 12.97 11.23 10.16 15.0(0.8) 7.5(1.9) CHXR71 2 10* 11 02 49.2 -77 21 43 13.14 11.41 10.36 19.7(0.7) 16.8(1.2) HM8 1 46 11 04 23.5 -77 18 09 16.25 14.48 12.36 29.1(1.1) 91.3(1.4) HH48 11 52 11 04 42.3 -77 41 57 13.63 11.78 10.61 11.5(0.7) 22.3(0.9) B18 6 55 11 04 57.7 -77 15 58 14.80 12.10 10.27 23.1(1.4) 14.4(2.1) Sz13 1 75 11 06 13.4 -77 21 53 9.42 7.66 6.27 264.7(2.3) 137.5(3.2) Ced 110/2 4 81 11 06 45.9 -77 27 05 12.00 10.31 8.76 74.8(1.1) 91.0(1.3) CHXR20 2 84 11 06 48.6 -77 22 34 12.95 23.0(1.3) 59.1(2.1) Ced 110/4 4 89 11 06 59.5 -77 18 54 12.92 11.30 9.89 44.6(1.1) 55.5(1.6) UY Cha 1 92 11 07 09.8 -77 23 05 10.94 216.4(3.3) 349.2(4.2) Ced 110/6 4 93 11 07 10.7 -77 43 48 16.72 14.15 12.52 8.9(1.1) CHXR22 2 95 11 07 16.8 -77 35 57 16.58 13.44 12.17 6.7(1.8) 11.8(1.5) Cha Hα1 5 100 11 07 21.0 -77 38 11 9.31 8.02 6.34 1159.4(18.4) 1643.4(36.9) LHα33217 1 101 11 07 21.9 -77 22 13 15.28 10.86 54.8(0.8) 120.0(1.2) B35 6 111 11 07 43.1 -77 34 00 15.26 12.15 10.55 24.5(1.4) 23.4(1.2) Cha Hα2 5 112 11 07 44.6 -77 39 41 12.56 10.20 8.34 114.2(1.8) 164.6(1.7) HM15 1 119 11 07 57.7 -77 38 45 12.76 10.18 7.19 1528.0(34.8) 2893.7(54.5) HM16 1 120 11 07 57.9 -77 42 42 14.58 11.98 9.92 60.4(1.2) Sz23 1 122* 11 08 00.9 -77 17 29 15.57 11.74 9.04 118.4(3.0) 90.9(1.4) CHXR30 2 123 11 08 01.3 -77 42 33 10.56 8.66 6.98 355.8(4.8) 459.0(4.9) VW Cha 1 124 11 08 03.1 -77 39 18 8.58 7.39 6.26 3704.4(83.7) 7473.2(79.6) HD97048 1 135 11 08 16.0 -77 33 54 10.54 8.58 6.22 2736.4(80.4) 5259.9(134.9) GlassI 1 150 11 08 37.1 -77 43 50 15.86 11.93 8.48 1278.8(21.2) 10260.8(166.0) IRN 1 152 11 08 40.0 -77 34 16 15.13 12.21 10.90 12.7(1.5) Cha Hα6 5 157 11 08 51.5 -76 25 14 14.74 12.45 11.30 7.5(1.5) Sz28 1 160 11 08 54.8 -77 32 11 14.75 12.17 10.92 5.8(0.8) CHXR78 2 162 11 08 55.2 -77 02 12 12.99 11.12 9.26 85.4(1.9) 69.8(1.3) VYCha 1 186 11 09 18.7 -76 30 31 14.91 11.63 8.95 117.9(1.7) 113.5(2.6) Hn9 7 189 11 09 23.3 -76 34 35 17.99 13.13 9.32 383.1(5.6) 611.3(19.3) C1-6 8 192 11 09 29.2 -76 33 30 12.24 230.7(2.3) 1391.2(48.5) Cha INa2 9 199 11 09 42.6 -76 35 01 13.56 9.80 126.6(6.7) 205.6(14.0) C1-25 8 200 11 09 43.0 -77 25 57 15.71 12.19 10.42 14.9(1.3) 12.3(2.3) Ced 110/9 4 204 11 09 46.9 -76 34 49 14.81 11.93 9.84 69.2(13.0) 93.4(14.0) Hn10E 7 207 11 09 47.8 -77 26 28 16.02 12.38 9.93 34.4(1.0) 35.1(1.4) Baud43 10 211 11 09 50.4 -76 36 48 8.84 7.56 7.05 6100.0(97.5) 7992.0(198.0) HD97300 1 223 11 09 54.1 -76 34 26 14.61 10.62 6.42 3071.4(63.1) 4451.6(109.8) HM23 1 224 11 09 54.6 -76 29 26 13.99 11.29 9.17 72.0(3.1) 81.9(2.9) Sz33 1 226 11 09 55.7 -76 32 42 13.87 9.52 243.1(2.7) 345.9(11.2) C1-2 8 228 11 09 58.8 -77 37 10 11.82 9.69 7.86 268.4(4.0) 262.0(3.1) WXCha 1 231 11 10 00.8 -76 34 59 11.02 8.56 5.75 2974.7(65.2) 4168.8(102.5) WWCha 1 232 11 10 04.3 -76 33 30 14.46 11.55 9.39 104.6(1.8) 102.9(2.8) Hn11 7 233 11 10 05.4 -76 35 46 11.93 10.23 9.04 48.3(7.2) 43.4(6.2) GK1 1 234 11 10 07.6 -76 29 38 11.60 9.87 8.31 154.6(1.8) 156.8(3.5) WYCha 1 251 11 10 38.4 -77 32 41 11.66 9.59 8.23 147.0(5.4) 162.5(2.7) CHXR47 3 254 11 10 50.0 -77 17 53 13.01 10.91 9.07 134.1(2.9) 238.6(1.6) HM27 1 258 11 10 54.0 -76 34 32 12.77 11.08 9.95 51.8(1.5) 57.8(1.9) WZCha 1 259 11 10 56.3 -76 45 33 13.85 11.13 9.96 31.4(1.8) 27.5(1.9) Hn13 7 1σ statistical errors for LW2 and LW3 are given in bracketts Ref.Id.: (1) Gauvin & Strom (1992); (2) Lawson et al. (1996); (3) Huenemoerder et al. (1994); (4) Prusti et al. (1991); (5) Comeron et al. (1999); (6) Alcala’ (1994); (7) Hartigan (1993); (8) Jones et al. (1985); (9) Persi et al. (1999); (10) Baud et al. (1984); (11) Schwartz (1991). ⋆ ISOCAM-DENIS identification uncertainty

1

Table 2: Positions and photometry of the new members in Cha I with IR excess. ISO-ChaI α(2000) δ(2000) I J K_s F_{6.7} F_{14.3} h m s ffi^0 ” mag. mag. mag. (mJy) (mJy) 1 11 02 16.3 -77 46 30 17.02 13.99 12.23 4.3(1.0) 13 11 02 53.1 -77 24 07 5.3(0.8) 8.8(1.1) 28 11 03 42.0 -77 26 51 15.91 13.05 11.91 3.2(0.7) 68* 11 05 53.7 -77 43 29 16.70 13.47 12.64 2.5(0.7) 71 11 06 04.3 -77 39 30 15.53 12.67 2.9(0.8) 79 11 06 39.4 -77 36 09 15.53 12.41 8.0(2.0) 9.9(1.5) 86 11 06 57.2 -77 22 51 45.7(1.5) 70.6(2.6) 91+ 11 07 09.6 -77 18 47 15.12 11.32 12.7(1.1) 26.3(1.5) 97+ 11 07 18.3 -77 23 13 11.83 51.2(1.1) 78.5(1.7) 98 11 07 19.0 -77 32 54 17.61 13.89 11.69 11.4(0.9) 9.2(1.3) 114 11 07 50.3 -77 10 01 15.30 14.19 12.85 2.9(0.7) 126+ 11 08 04.0 -77 38 42 14.39 11.64 8.24 676.4(5.7) 1279.3(16.8) 138 11 08 19.2 -77 30 41 16.74 14.07 13.02 15.3(0.8) 17.6(1.3) 143 11 08 23.2 -77 30 28 15.43 12.65 11.06 15.6(1.5) 16.5(1.5) 145 11 08 25.4 -76 55 58 15.03 13.31 11.87 5.9(0.9) 147 11 08 27.1 -77 15 52 16.79 13.73 12.34 4.3(1.1) 154 11 08 43.5 -76 27 49 14.42 12.84 11.32 5.6(0.9) 164 11 08 55.4 -76 39 42 13.49 12.51 11.60 4.9(1.1) 165 11 08 55.6 -76 32 43 15.87 13.03 11.38 12.0(1.8) 177* 11 09 07.9 -76 49 10 14.75 13.12 11.95 2.9(0.9) 206 11 09 47.7 -76 51 18 16.05 13.32 2.9(0.5) 209+ 11 09 49.0 -77 14 38 15.19 12.06 6.7(0.7) 7.0(1.4) 216 11 09 52.4 -76 57 59 15.74 13.27 11.40 10.3(0.6) 217 11 09 52.6 -76 39 13 16.54 13.28 11.70 10.3(2.5) 220 11 09 53.8 -77 28 35 18.11 14.36 12.38 5.3(0.7) 6.7(1.1) 225 11 09 55.0 -76 31 12 17.12 14.86 13.05 16.1(1,6) 17.0(2.3) 235 11 10 08.7 -77 27 46 17.58 13.47 11.18 15.7(1.1) 17.2(1.2) 237+ 11 10 12.1 -76 35 30 13.90 10.77 8.51 186.3(6.2) 238.5(8.8) 247 11 10 34.0 -76 39 23 16.06 13.15 11.31 6.3(1.6) 250 11 10 36.8 -77 22 13 15.57 12.34 10.80 20.0(0.7) 5.5(1.2) 252 11 10 42.3 -77 20 47 17.11 13.75 12.30 5.5(0.8) 6.8(1.2) 256+ 11 10 52.4 -77 25 07 17.51 13.28 10.83 38.4(0.7) 47.4(1.2) 274* 11 11 24.8 -77 06 13 16.27 14.41 13.38 6.3(0.6) 282 11 12 04.0 -77 26 03 15.52 13.01 11.56 7.6(1.2) 8.2(1.5) + New YSOs candidates proposed by Cambrésy et al. (1998) ⋆ ISOCAM-DENIS identification uncertainty 1σ statitical errors for LW2 and LW3 are given in brackets.

Table 3: Physical parameters of the identified Cha I cloud members. ISO-ChaI A_J L_⋆() α_{IR} Sp.type Id. IR Class 3 0.3 1.61 -2.4 K4 CSCha Class III 4 0.5 0.22 -2.1 M2 CHXR71 Class III 10 0.6 0.20 -1.5 M0.5 HM8 Class II 17 1.1 0.66 -2.9 G5 CHXR11 Class III 32 1.2 0.35 -2.5 Hn2 Class III 34 0.4 0.26 -2.7 M3 CHXR12 Class III 46 0.5 0.03 +0.3 HH48 Class I-II 48 1.0 0.44 -2.8 HM10 Class III 52 0.5 0.12 -1.3 B18 Class II 55 1.2 0.16 -1.5 Sz13 Class II 65 0.4 0.14 M5 CHXR15 75 0.8 8.80 -2.4 K6 Ced 110/2 Class III 78 1.1 0.07 M4.5 CHXR73 80 0.7 0.31 UXCha 81 0.6 0.56 -1.4 M0 CHXR20 Class II 87 0.4 0.11 M4.5 CHXR74 89 0.5 0.19 -1.2 M1.5 UYCha Class II 93 1.5 0.04 K7 CHXR22 94 0.8 0.28 K7 Hn6 95 0.3 0.02 -0.8 M7.5 Cha Hα1 Class II 100 0.7 9.94 -1.1 G2 LHα33217 Class II 105 0.3 0.12 M1 CHXR25 106 0.4 0.07 M5 B34 108 2.3 0.93 K7 CHXR26 111 1.3 0.08 -1.3 M6 Cha Hα2 Class II 112 1.1 0.95 -1.3 M1 HM15 Class II 116 0.6 0.06 M6 Cha Hα3 117 0.7 1.82 -2.8 M1 CHX10a Class III 119 1.4 1.56 -0.4 K7 HM16 Class II 120 1.1 0.17 M2.5 Sz23 122 2.5 0.93 -1.3 K7 CHXR30 Class II 123 0.7 2.90 -1.5 M0.5 VWCha Class II 135 1.0 4.29 K7 Glass I 136 0.5 0.20 M3.5 HM19 144 0.6 0.08 M6 Cha Hα5 151 0.3 0.10 -2.3 M0 HM20 Class III 152 0.8 0.08 M6 Cha Hα6 153 0.9 0.66 M0 CHX13a 157 0.9 0.09 Sz28 160 0.6 0.07 M5.5 CHXR78 162 0.7 0.29 -1.3 M0.5 VYCha Class II 174 0.7 0.14 Hn7 182 0.4 0.84 -2.6 M0 Sz30 Class III 185 0.8 1.15 -2.8 K7 CHXR37 Class III 186 1.7 0.40 -1.2 Hn9 Class II 189 2.9 0.32 -0.4 C1-6 Class II 198 0.6 0.88 K7 CHXR40 200 1.8 0.39 -1.5 Ced 110/9 Class II 204 1.3 0.23 -0.9 Hn10e Class II 207 1.9 0.26 -1.4 Baud43 Class II 223 2.2 3.63 -0.5 HM23 Class II 224 1.4 0.48 -1.3 M0 Sz33 Class II 228 1.0 1.53 -1.3 M0 WXCha Class II 231 1.4 6.56 -0.9 K5 WWCha Class II 232 1.4 0.33 -1.1 Hn11 Class II 233 0.6 0.61 -1.6 M0 GK1 Class II-Class III 234 0.8 1.10 -1.4 K7 WYCha Class II 244 0.8 0.19 Hn12W 251 1.1 2.22 -1.4 K3 CHXR47 Class II 254 1.1 0.56 -0.8 K7 HM27 Class II 258 0.5 0.26 -1.1 M1 WZCha Class II 259 1.2 0.42 -1.5 Hn13 Class II

3

Table 4: Physical parameters of new Cha I cloud members. ISO-ChaI A_J L_⋆() α(IR) IR Class 1 1.5 0.04 13 0.05 28 1.3 0.08 68 1.6 0.07 71 0.03 79 0.07 -0.8 Class II 86 0.28 91 0.10 -0.9 Class II 97 0.31 -0.0 Class II 98 2.0 0.07 -1.2 Class II 114 0.4 0.03 126 1.2 0.27 -0.3 Class II 138 1.2 0.03 -0.2 Class II 143 1.3 0.11 -1.2 Class II 145 0.4 0.03 147 1.5 0.05 154 0.3 0.04 164 0.2 0.04 165 1.3 0.08 177 0.3 0.03 206 0.03 209 0.06 -1.2 Class II 216 1.0 0.05 217 1.6 0.09 220 2.0 0.05 -1.1 Class II 225 0.8 0.02 -0.2 Class II 235 2.3 0.14 -1.2 Class II 237 1.5 0.79 -1.1 Class II 247 1.4 0.08 250 1.6 0.20 -1.9 ClassII-III 252 1.7 0.06 -1.1 Class II 256 2.4 0.17 -0.8 Class II 274 0.7 0.02 282 1.0 0.06 -1.4 Class II