HS 0942+4622 z=1.447

4000 5000 6000 7000 [Å] Wavelength

012345[10e-16]

Flux

HS 1803+5425 z=1.448

4000 5000 6000 7000 [Å] Wavelength

02468[10e-16]

HS 1228+4654 z=1.516

4000 5000 6000 [Å] Wavelength

12345[10e-16]

HS 1230+4741 z=1.529

4000 5000 6000 [Å] Wavelength

12345678[10e-16]

HS 0740+3222 z=1.531

4000 5000 6000 [Å] Wavelength

0.51.5Flux

HS 1709+6027 z=1.537

4000 5000 6000 [Å] Wavelength

0.51.5[10e-15]

HS 1237+4756 z=1.554

4000 5000 6000 [Å] Wavelength

0.20.50.81[10e-15]

HS 0621+6738 z=1.588

4000 5000 6000 [Å] Wavelength HS 0948+4735 z=1.594

4000 5000 6000 [Å] Wavelength

HS 1728+6049 z=1.638

5000 6000 7000 8000 [Å] Wavelength

0100200Flux

HS 1234+4616 z=1.647

4000 5000 6000 [Å] Wavelength

0.51.52[10e-15]

HS 1004+4543 z=1.657

4000 5000 6000 [Å] Wavelength