HS 1831+5338 z=0.039

4000 5000 6000 7000 8000 [Å] Wavelength

0103050Flux

HS 0328+0528 z=0.046

4000 5000 6000 7000 [Å] Wavelength

02468[10e-15]

Flux

HS 0843+2533 z=0.057

7000 8000 9000 [Å] Wavelength

012[10e-15]

HS 1817+5342 z=0.080

4000 5000 6000 [Å] Wavelength

0100200Flux

HS 2247+1044 z=0.083

4000 5000 6000 7000 [Å] Wavelength

HS 0338+0443 z=0.084

4000 5000 6000 [Å] Wavelength

123[10e-15]

HS 1245+4605 z=0.143

4000 5000 6000 [Å] Wavelength

HS 1616+6445 z=0.171

4000 5000 6000 7000 8000 [Å] Wavelength HS 0806+6212 z=0.173

4000 5000 6000 [Å] Wavelength

0.51.5[10e-15]

HS 0626+6745 z=0.225

4000 5000 6000 [Å] Wavelength

0.51[10e-15]

HS 0943+4725 z=0.233

4000 5000 6000 7000 [Å] Wavelength

01234[10e-16]

HS 0856+2757 z=0.244

4000 5000 6000 [Å] Wavelength

012345[10e-16]