
\begin{table*}
\caption{Equivalent Widths from Giraffe spectra. The full data is available in electronic form.}
\tiny
\begin{tabular}{lrrrrrrrrrrrrr}
\hline
El   & Wavel.  & E.P. & log gf &6005198&6005934&6007741&6010149&6012768&7004955&7006255&7006305&7006319&7006354\\
     & (\AA)   & (eV) &       &(m\AA)~~&(m\AA)~~&(m\AA)~~&(m\AA)~~&(m\AA)~~&(m\AA)~~&(m\AA)~~&(m\AA)~~&(m\AA)~~&(m\AA)~\\
\hline
 8.1 & 6300.31 & 0.00 &  -9.75 &  45.0 &  54.0 &   0.0 &   0.0 &   0.0 &  36.5 &   0.0 &  57.4 &  44.0 &  56.0 \\
 8.1 & 6363.79 & 0.02 & -10.25 &  38.0 &  28.0 &  14.0 &   0.0 &  16.0 &   0.0 &  11.0 &  18.0 &  29.0 &  36.0 \\
11.1 & 6154.23 & 2.10 &  -1.57 & 126.7 &  78.4 & 117.8 &   0.0 &  83.4 & 163.3 & 116.3 & 122.3 &  74.6 & 114.7 \\
11.1 & 6160.75 & 2.10 &  -1.26 & 141.0 & 103.7 & 133.4 &   0.0 &   0.0 & 182.8 & 147.2 & 139.4 & 102.6 & 126.2 \\
12.1 & 5711.09 & 4.34 &  -1.71 &   0.0 & 124.8 &   0.0 & 154.0 &   0.0 &   0.0 & 113.5 & 158.6 & 143.0 &   0.0 \\
12.1 & 6318.71 & 5.11 &  -1.97 &  63.8 &  72.5 & 100.3 &   0.0 &  52.0 &  74.3 &  75.6 &  84.6 &  85.3 &  70.5 \\
12.1 & 6319.24 & 5.11 &  -2.20 &  57.5 &  66.4 &  54.0 &   0.0 &  47.7 &  68.1 &  63.0 &  74.0 &  80.7 &  63.7 \\
14.1 & 5645.62 & 4.93 &  -2.14 &  37.7 &  57.8 &   0.0 &  84.6 &   0.0 &   0.0 &  53.2 &  65.6 &  64.9 &   0.0 \\
14.1 & 5665.56 & 4.92 &  -2.04 &  90.0 &  96.1 &   0.0 &  97.1 &   0.0 &   0.0 &  58.6 &  49.3 &  67.3 &   0.0 \\
14.1 & 5684.49 & 4.95 &  -1.65 & 109.2 &  57.2 &   0.0 &  75.2 &   0.0 &   0.0 &  75.8 &  69.6 &  77.4 &   0.0 \\
14.1 & 5690.43 & 4.93 &  -1.87 &  38.9 &  65.5 &   0.0 &  70.8 &   0.0 &   0.0 &  42.2 &  47.1 &  61.7 &   0.0 \\
14.1 & 5793.08 & 4.93 &  -2.06 &  39.9 &  55.3 &   0.0 &  62.2 &   0.0 &   0.0 &  43.9 &  46.7 &  73.3 &   0.0 \\
14.1 & 6125.03 & 5.61 &  -1.57 &  44.3 &  56.5 & 133.6 &   0.0 &  38.3 &  57.9 &  35.5 &  53.3 &  36.1 &  47.6 \\
14.1 & 6145.02 & 5.61 &  -1.44 &  45.3 &  49.5 &  57.2 &   0.0 &  39.9 &  41.4 &  39.2 &  51.9 &  34.3 &  43.0 \\
20.1 & 6161.30 & 2.52 &  -1.27 & 141.9 & 157.2 & 200.2 &   0.0 & 114.4 & 186.4 & 144.0 & 158.3 & 147.8 & 155.6 \\
20.1 & 6166.44 & 2.52 &  -1.14 & 128.3 & 144.1 & 163.0 &   0.0 &  98.3 & 175.8 & 130.3 & 147.7 & 128.3 & 140.7 \\
20.1 & 6169.04 & 2.52 &  -0.80 & 158.8 & 161.9 & 179.6 &   0.0 & 124.9 & 203.7 & 168.5 & 169.6 & 159.0 & 173.3 \\
20.1 & 6169.56 & 2.52 &  -0.48 & 176.2 & 160.5 & 212.7 &   0.0 & 145.4 & 220.9 &   0.0 & 177.6 & 184.3 & 163.2 \\
21.2 & 5640.99 & 1.50 &  -0.86 &  77.2 &  89.9 &   0.0 &   0.0 &   0.0 &   0.0 &  99.2 &  82.4 &  97.9 &   0.0 \\
21.2 & 5667.15 & 1.50 &  -1.11 &  90.4 &  88.9 &   0.0 &   0.0 &   0.0 &   0.0 &  95.4 &  71.2 &  95.4 &   0.0 \\
21.2 & 5669.04 & 1.50 &  -1.00 &  93.4 &  75.8 &   0.0 &   0.0 &   0.0 &   0.0 &  75.0 &  60.4 &  88.5 &   0.0 \\
21.2 & 5671.83 & 1.45 &   0.56 &  71.0 & 119.9 &   0.0 & 149.4 &   0.0 &   0.0 &  97.7 & 100.7 & 115.8 &   0.0 \\
21.2 & 6245.62 & 1.51 &  -1.05 &  90.6 &  92.1 & 104.3 &   0.0 &  59.2 & 116.4 & 102.5 &  88.7 & 100.1 &  86.8 \\
21.2 & 6279.74 & 1.50 &  -1.16 &  82.0 &  89.6 & 114.7 &   0.0 &  59.0 &  94.7 &  94.0 &  75.4 & 100.6 &  63.0 \\
22.1 & 6126.22 & 1.07 &  -1.42 & 178.0 & 136.2 & 216.3 &   0.0 & 113.9 & 201.7 & 150.0 & 156.9 & 153.2 & 178.4 \\
23.1 & 5624.89 & 1.05 &  -1.07 &  62.8 &  75.5 &   0.0 & 108.5 &   0.0 &   0.0 &  85.2 &  66.9 & 104.7 &   0.0 \\
23.1 & 5626.01 & 1.04 &  -1.25 &  88.6 &  95.3 &   0.0 & 157.0 &   0.0 &   0.0 & 112.8 &  96.8 & 112.2 &   0.0 \\
23.1 & 5627.64 & 1.08 &  -0.37 &  76.6 &   0.0 &   0.0 & 155.4 &   0.0 &   0.0 & 110.6 & 102.9 & 131.1 &   0.0 \\
23.1 & 5657.44 & 1.06 &  -1.02 &  64.0 & 100.7 &   0.0 & 117.3 &   0.0 &   0.0 &  86.0 &  89.0 &  92.0 &   0.0 \\
23.1 & 5668.36 & 1.08 &  -1.02 &  74.5 &  92.8 &   0.0 &  89.0 &   0.0 &   0.0 & 104.0 &  84.2 & 101.4 &   0.0 \\
23.1 & 5670.86 & 1.08 &  -0.42 &  91.4 & 136.0 &   0.0 & 128.0 &   0.0 &   0.0 & 128.2 & 112.8 & 133.5 &   0.0 \\
23.1 & 5698.53 & 1.06 &  -0.11 & 124.2 & 109.1 &   0.0 & 192.1 &   0.0 &   0.0 & 126.6 & 117.9 & 172.4 &   0.0 \\
23.1 & 5727.06 & 1.08 &  -0.01 & 108.9 &  98.3 &   0.0 & 192.5 &   0.0 &   0.0 & 130.5 & 165.8 & 179.8 &   0.0 \\
23.1 & 5737.06 & 1.06 &  -0.74 & 107.9 &  91.3 &   0.0 & 154.7 &   0.0 &   0.0 & 119.5 & 130.0 & 129.7 &   0.0 \\
23.1 & 5743.45 & 1.08 &  -0.97 &  78.5 &  75.1 &   0.0 & 150.8 &   0.0 &   0.0 &  92.9 & 124.6 & 132.9 &   0.0 \\
23.1 & 6251.82 & 0.29 &  -1.34 & 216.7 & 135.4 & 178.5 &   0.0 & 113.3 & 218.5 & 194.7 & 193.7 & 197.5 & 212.7 \\
24.1 & 5628.65 & 3.42 &  -0.77 &  31.7 &  83.4 &   0.0 &  63.2 &   0.0 &   0.0 &  49.7 &  43.9 &  61.1 &   0.0 \\
24.1 & 5783.07 & 3.32 &  -0.40 &  75.0 & 105.5 &   0.0 &  72.4 &   0.0 &   0.0 &  70.6 &  57.9 &  74.7 &   0.0 \\
24.1 & 5787.93 & 3.32 &  -0.08 &  79.9 & 101.9 &   0.0 & 105.8 &   0.0 &   0.0 &  90.0 &  89.8 & 107.6 &   0.0 \\
24.1 & 6330.10 & 0.94 &  -2.87 & 183.6 & 117.5 & 154.1 &   0.0 &   0.0 & 166.7 & 161.3 & 163.0 & 162.2 & 175.8 \\
26.1 & 5619.61 & 4.39 &  -1.49 &  48.9 &  78.5 &   0.0 &  71.4 &   0.0 &   0.0 &  38.9 &  53.4 &  68.0 &   0.0 \\
26.1 & 5635.83 & 4.26 &  -1.59 &  58.1 &  63.3 &   0.0 &  91.5 &   0.0 &   0.0 &  68.3 &  62.0 &  72.9 &   0.0 \\
26.1 & 5636.70 & 3.64 &  -2.53 &  48.2 &  64.1 &   0.0 &  70.2 &   0.0 &   0.0 &  71.4 &  62.8 &  68.8 &   0.0 \\
26.1 & 5650.00 & 5.10 &  -0.80 &  38.3 &  63.8 &   0.0 &  65.4 &   0.0 &   0.0 &  54.8 &  62.3 &  73.7 &   0.0 \\
26.1 & 5651.48 & 4.47 &  -1.79 &  38.8 &  46.4 &   0.0 &  53.6 &   0.0 &   0.0 &  46.0 &  58.9 &  51.0 &   0.0 \\
26.1 & 5652.33 & 4.26 &  -1.77 &  46.4 &  62.9 &   0.0 &  55.6 &   0.0 &   0.0 &  52.5 &  39.6 &  63.4 &   0.0 \\
26.1 & 5717.84 & 4.28 &  -0.98 &  71.3 &  76.0 &   0.0 & 121.6 &   0.0 &   0.0 &  85.0 &  99.0 &  87.2 &   0.0 \\
26.1 & 5731.77 & 4.26 &  -1.10 &   0.0 &  62.7 &   0.0 & 104.3 &   0.0 &   0.0 &  85.2 &  94.4 &  88.5 &   0.0 \\
26.1 & 5738.24 & 4.22 &  -2.24 &  38.5 &  66.3 &   0.0 &  61.4 &   0.0 &   0.0 &  41.4 &  54.6 &  41.5 &   0.0 \\
26.1 & 5741.86 & 4.26 &  -1.69 &  66.7 &  50.0 &   0.0 &  87.4 &   0.0 &   0.0 &  53.4 &  59.2 &  67.0 &   0.0 \\
26.1 & 5752.04 & 4.55 &  -0.92 &  74.8 &  54.3 &   0.0 &  87.0 &   0.0 &   0.0 &  85.2 &  74.6 &  65.5 &   0.0 \\
26.1 & 5775.09 & 4.22 &  -1.11 &  64.0 &  79.1 &   0.0 &  92.9 &   0.0 &   0.0 &  73.1 &  75.3 & 102.1 &   0.0 \\
26.1 & 5793.92 & 4.22 &  -1.62 &  69.9 &  48.3 &   0.0 &  77.7 &   0.0 &   0.0 &  64.9 &  51.2 &  78.8 &   0.0 \\
26.1 & 5806.73 & 4.61 &  -0.93 &  49.3 &  83.3 &   0.0 &  89.6 &   0.0 &   0.0 &  77.7 &  91.4 &  88.7 &   0.0 \\
26.1 & 5827.87 & 3.28 &  -3.16 &  56.6 &  57.2 &   0.0 &   0.0 &   0.0 &   0.0 &  63.4 &   0.0 &  74.9 &   0.0 \\
26.1 & 6151.62 & 2.18 &  -3.26 & 137.4 & 125.0 & 153.8 &   0.0 &  96.9 & 166.3 & 123.8 & 140.8 & 113.2 &  91.8 \\
26.1 & 6159.38 & 4.61 &  -1.88 &  57.2 &  32.4 &  65.3 &   0.0 &  85.3 &  38.4 &  33.9 &  48.6 &  24.6 &  51.8 \\
26.1 & 6165.36 & 4.14 &  -1.48 &  70.1 &  93.3 & 105.3 &   0.0 &  76.0 &  96.4 &  66.8 &  86.3 &  58.9 &  83.3 \\
26.1 & 6173.34 & 2.22 &  -2.84 & 145.8 & 154.5 & 174.2 &   0.0 & 119.9 & 190.7 & 152.3 & 147.1 & 146.2 & 154.8 \\
26.1 & 6187.40 & 2.83 &  -4.12 &  47.1 &  42.7 &  50.2 &   0.0 &  33.7 &  57.9 &  40.8 &  49.4 &  33.3 &  42.2 \\
26.1 & 6188.00 & 3.94 &  -1.60 &  78.4 &  84.2 & 103.4 &   0.0 &  74.8 & 108.2 &  81.8 &  93.4 &  68.3 &  91.3 \\
26.1 & 6200.32 & 2.61 &  -2.39 & 125.6 & 138.8 & 167.8 &   0.0 &  62.5 & 171.4 & 139.0 & 137.1 & 131.1 & 141.6 \\
26.1 & 6213.44 & 2.22 &  -2.54 & 158.2 & 165.7 & 183.8 &   0.0 & 134.8 & 200.8 & 171.2 & 166.5 & 174.4 & 173.8 \\
26.1 & 6219.29 & 2.20 &  -2.39 & 181.0 & 156.9 & 171.3 &   0.0 & 125.7 & 196.6 & 180.6 & 187.5 & 178.3 & 186.0 \\
26.1 & 6232.65 & 3.65 &  -1.21 & 117.7 & 131.0 & 170.5 &   0.0 & 129.6 & 155.2 & 127.7 & 134.8 & 136.5 & 134.0 \\
26.1 & 6240.65 & 2.22 &  -3.23 & 139.1 & 119.0 & 138.5 &   0.0 &  94.7 & 142.9 & 135.0 & 121.8 & 103.4 & 121.8 \\
26.1 & 6265.14 & 2.18 &  -2.51 & 202.6 & 155.0 & 185.1 &   0.0 & 150.0 & 210.9 & 209.9 & 198.5 & 193.4 & 204.6 \\
26.1 & 6270.23 & 2.86 &  -2.55 & 101.7 & 116.5 & 129.7 &   0.0 &  78.2 & 133.3 & 136.0 & 103.9 & 123.3 & 109.6 \\
26.1 & 6311.50 & 2.83 &  -3.16 & 101.2 &  74.2 &  96.1 &   0.0 &  70.6 & 117.6 & 105.1 &  99.5 & 101.6 &  95.4 \\
26.1 & 6315.81 & 4.07 &  -1.67 &  62.9 &  73.4 &  80.4 &   0.0 &  54.1 &  74.7 &  74.0 &  67.4 &  75.7 &  70.4 \\
26.1 & 6322.69 & 2.59 &  -2.38 & 144.8 & 122.0 & 129.3 &   0.0 & 107.9 & 152.4 & 162.5 & 140.1 & 145.1 & 156.4 \\
26.1 & 6330.85 & 4.73 &  -1.22 &  46.9 &  60.9 &  53.9 &   0.0 &  37.6 &  52.2 &  42.5 &  63.7 &  67.6 &  56.5 \\
26.1 & 6335.34 & 2.20 &  -2.28 & 216.7 & 152.5 & 183.4 &   0.0 & 158.5 & 218.5 & 211.1 & 215.7 & 207.9 & 227.0 \\
26.1 & 6353.84 & 0.91 &  -6.41 &  71.6 &  46.0 &  81.9 &   0.0 &  41.2 &  77.2 &  69.3 &  61.9 &  64.8 &  60.6 \\
26.1 & 6380.75 & 4.19 &  -1.34 & 102.5 &  68.9 &  89.6 &   0.0 &  73.4 &  86.8 &  85.0 &  91.5 &  96.3 &  93.0 \\
26.1 & 6392.54 & 2.28 &  -3.97 &  97.1 &  52.5 &  77.2 &   0.0 &  60.7 &  63.4 &  96.0 &  81.2 &  85.6 &  88.4 \\
26.2 & 6247.56 & 3.87 &  -2.32 &  23.4 &  39.4 &  26.2 &   0.0 &  38.4 &  26.1 &  23.8 &  33.1 &   0.0 &  38.7 \\
26.2 & 6369.46 & 2.89 &  -4.21 &  26.9 &  24.2 &   0.0 &   0.0 &  53.4 &   0.0 &   0.0 &  31.9 &  30.0 &  28.1 \\
28.1 & 5643.09 & 4.16 &  -1.25 &  31.8 &  29.3 &   0.0 &  54.0 &   0.0 &   0.0 &  23.6 &  47.5 &  45.5 &   0.0 \\
28.1 & 5709.56 & 1.68 &  -2.14 & 107.2 & 160.4 &   0.0 & 178.9 &   0.0 &   0.0 & 160.8 & 130.0 & 177.0 &   0.0 \\
28.1 & 5760.84 & 4.10 &  -0.81 & 114.3 &  60.2 &   0.0 & 100.1 &   0.0 &   0.0 &  85.0 &  82.1 &  68.3 &   0.0 \\
28.1 & 5805.23 & 4.17 &  -0.60 &  40.0 &  63.3 &   0.0 &  78.2 &   0.0 &   0.0 &   0.0 &  89.0 &  75.7 &   0.0 \\
28.1 & 6128.98 & 1.68 &  -3.39 & 118.9 &  99.0 & 131.0 &   0.0 &  96.5 & 143.5 &  97.1 & 124.6 &  92.4 & 128.2 \\
28.1 & 6130.14 & 4.26 &  -0.98 &  39.2 &  27.9 &  47.6 &   0.0 &  37.6 &  33.9 &  39.4 &  54.3 &  34.3 &  47.1 \\
28.1 & 6176.82 & 4.09 &  -0.24 &  81.8 & 106.0 & 118.3 &   0.0 &  84.2 & 110.3 &  75.7 & 103.6 &  61.9 &  97.7 \\
28.1 & 6177.25 & 1.83 &  -3.60 &  87.6 &  77.3 &  93.1 &   0.0 &  70.3 & 111.6 &  71.3 &  94.6 &  61.6 &  92.9 \\
28.1 & 6186.72 & 4.10 &  -0.90 &  68.2 &  47.5 &  57.3 &   0.0 &  60.7 &  68.4 &  54.0 &  73.3 &  50.3 &  74.0 \\
28.1 & 6204.61 & 4.09 &  -1.15 &   0.0 &  41.3 &  77.0 &   0.0 &  43.8 &  56.2 &  44.5 &  52.1 &  33.8 &  25.7 \\
28.1 & 6223.99 & 4.10 &  -0.97 &  46.2 &  42.5 &  54.1 &   0.0 &  47.0 &  49.6 &  39.9 &  51.9 &  34.4 &   0.0 \\
28.1 & 6230.10 & 4.10 &  -1.20 &  50.1 &  61.2 & 116.2 &   0.0 &  44.8 &  66.1 &  50.2 &  62.2 &  38.0 &  54.4 \\
28.1 & 6322.17 & 4.15 &  -1.21 &  32.2 &   0.0 &  26.0 &   0.0 &  35.3 &  28.4 &  24.3 &   0.0 &  23.3 &  33.6 \\
28.1 & 6327.60 & 1.68 &  -3.08 & 136.0 & 115.5 & 148.1 &   0.0 &  91.5 & 153.1 & 147.9 & 142.1 & 137.7 & 126.5 \\
28.1 & 6378.26 & 4.15 &  -0.82 &  57.9 &  49.8 &  66.9 &   0.0 &  52.4 &  55.0 &  64.7 &  63.6 &  55.6 &  51.4 \\
28.1 & 6384.67 & 4.15 &  -1.00 &  48.5 &  44.3 &  66.2 &   0.0 &  38.5 &  55.8 &  65.6 &  63.1 &  47.5 &  50.2 \\
56.1 & 6141.75 & 0.70 &   0.00 & 206.2 & 189.2 & 382.1 &   0.0 & 160.5 & 238.2 & 192.8 & 188.0 & 185.2 & 213.3 \\
\hline
\end{tabular}
\normalsize
\end{table*}

\addtocounter{table}{-1}

\begin{table*}
\caption{Equivalent Widths from Giraffe spectra (in electronic form)}
\tiny
\begin{tabular}{lrrrrrrrrrrrrr}
\hline
El   & Wavel.  & E.P. & log gf &7006377&7006470&7006590&7006935&7006983&7007064&7007118&7007884&7008891&7013582\\
     & (\AA)   & (eV) &        &(m\AA)~~&(m\AA)~~&(m\AA)~~&(m\AA)~~&(m\AA)~~&(m\AA)~~&(m\AA)~~&(m\AA)~~&(m\AA)~~&(m\AA)~~\\
\hline
 8.1 & 6300.31 & 0.00 &  -9.75 &  30.0 &   0.0 &  42.0 &  68.0 &  52.0 &  67.0 &  63.0 &  68.0 &  75.0 &  53.0 \\
 8.1 & 6363.79 & 0.02 & -10.25 &  23.0 &  26.0 &  23.0 &  35.0 &  37.0 &  30.3 &  30.7 &  34.0 &  34.0 &  32.0 \\
11.1 & 6154.23 & 2.10 &  -1.57 & 123.7 &  78.8 &  56.3 &  79.8 & 101.6 &  89.7 &  98.3 &  90.9 &  77.9 & 107.0 \\
11.1 & 6160.75 & 2.10 &  -1.26 & 148.2 & 104.6 &  79.0 & 118.6 & 116.7 & 101.3 & 126.1 & 114.6 & 100.5 & 124.6 \\
12.1 & 5711.09 & 4.34 &  -1.71 & 134.0 & 125.9 & 111.7 & 150.5 & 156.0 & 151.0 & 146.8 &   0.0 &   0.0 &   0.0 \\
12.1 & 6318.71 & 5.11 &  -1.97 &  75.0 &  84.9 &  77.8 &  85.2 &  88.5 &  77.9 &  93.8 &  94.2 &  79.3 &  93.1 \\
12.1 & 6319.24 & 5.11 &  -2.20 &  65.8 &  69.2 &  75.6 &  71.9 &  77.7 &  66.0 &  74.2 &  71.0 &  57.4 &  80.2 \\
14.1 & 5645.62 & 4.93 &  -2.14 &  63.3 &  60.6 &  60.1 &  55.6 &  64.5 &  58.7 &  65.5 &   0.0 &   0.0 &   0.0 \\
14.1 & 5665.56 & 4.92 &  -2.04 &  69.1 &  51.3 &  60.8 &  57.8 &  58.0 &  55.6 &  70.7 &   0.0 &   0.0 &   0.0 \\
14.1 & 5684.49 & 4.95 &  -1.65 &  66.9 &  53.3 &  66.8 &  56.8 &  65.9 &  56.2 &  69.5 &   0.0 &   0.0 &   0.0 \\
14.1 & 5690.43 & 4.93 &  -1.87 &  56.6 &  47.3 &  45.8 &  54.0 &  62.3 &  55.5 &  53.7 &   0.0 &   0.0 &   0.0 \\
14.1 & 5793.08 & 4.93 &  -2.06 &  28.5 &  56.3 &  50.2 &  61.7 &  56.1 &  61.1 &  57.6 &   0.0 &   0.0 &   0.0 \\
14.1 & 6125.03 & 5.61 &  -1.57 &  54.2 &  38.6 &  24.5 &  34.0 &  53.5 &  46.1 &  48.6 &  37.2 &  25.3 &  53.2 \\
14.1 & 6145.02 & 5.61 &  -1.44 &  48.8 &  35.8 &   0.0 &  30.0 &  54.6 &  40.1 &  45.3 &   0.0 &  22.3 &  52.0 \\
20.1 & 6161.30 & 2.52 &  -1.27 & 156.8 & 163.2 & 117.6 & 157.7 & 153.3 & 145.2 & 165.5 & 149.9 & 148.9 & 164.4 \\
20.1 & 6166.44 & 2.52 &  -1.14 & 146.5 & 131.9 &  96.4 & 142.3 & 143.4 & 138.1 & 152.4 & 131.6 & 140.5 & 148.6 \\
20.1 & 6169.04 & 2.52 &  -0.80 & 173.4 & 165.8 & 127.9 & 173.4 & 172.7 & 165.7 & 180.2 & 164.2 & 169.8 & 181.7 \\
20.1 & 6169.56 & 2.52 &  -0.48 & 188.8 & 167.7 & 155.0 & 192.1 & 189.4 & 164.5 & 186.3 & 171.9 & 189.1 & 189.5 \\
21.2 & 5640.99 & 1.50 &  -0.86 & 109.4 &   0.0 &  89.0 &  95.9 &  98.3 &  84.3 & 111.6 &   0.0 &   0.0 &   0.0 \\
21.2 & 5667.15 & 1.50 &  -1.11 &  73.5 &  46.1 &  96.2 &  87.0 &  98.7 &  94.6 & 110.8 &   0.0 &   0.0 &   0.0 \\
21.2 & 5669.04 & 1.50 &  -1.00 &  87.9 &  66.3 &  69.4 &  82.5 &  78.2 &  84.1 &  81.4 &   0.0 &   0.0 &   0.0 \\
21.2 & 5671.83 & 1.45 &   0.56 & 111.1 &  82.4 &  77.8 &  98.5 &  92.8 & 108.9 & 107.1 &   0.0 &   0.0 &   0.0 \\
21.2 & 6245.62 & 1.51 &  -1.05 & 100.0 & 106.3 &  85.0 & 110.7 &  96.0 &  85.8 & 100.0 & 108.9 & 109.3 &  83.5 \\
21.2 & 6279.74 & 1.50 &  -1.16 &  86.2 &  93.9 &  87.2 & 109.7 &  88.4 &  66.3 & 101.7 &  78.3 & 101.8 &  96.8 \\
22.1 & 6126.22 & 1.07 &  -1.42 & 161.5 & 149.2 & 114.4 & 174.3 & 158.7 & 176.1 & 176.4 & 160.3 & 158.6 & 125.3 \\
23.1 & 5624.89 & 1.05 &  -1.07 &  92.4 &  62.2 &  91.1 &  85.1 &  83.0 &  91.4 &  90.9 &   0.0 &   0.0 &   0.0 \\
23.1 & 5626.01 & 1.04 &  -1.25 & 111.6 &  72.9 &  93.6 & 113.5 &  93.6 & 111.5 & 125.5 &   0.0 &   0.0 &   0.0 \\
23.1 & 5627.64 & 1.08 &  -0.37 & 133.9 & 108.2 & 110.4 & 127.5 & 119.3 & 136.3 & 139.1 &   0.0 &   0.0 &   0.0 \\
23.1 & 5657.44 & 1.06 &  -1.02 & 100.9 &   0.0 &  68.7 &  93.4 &  85.8 & 105.9 &  96.8 &   0.0 &   0.0 &   0.0 \\
23.1 & 5668.36 & 1.08 &  -1.02 &   0.0 &  80.0 &  74.9 & 114.4 &  90.0 & 108.6 & 117.4 &   0.0 &   0.0 &   0.0 \\
23.1 & 5670.86 & 1.08 &  -0.42 & 130.7 & 107.9 & 103.8 & 135.9 & 118.5 & 145.0 & 138.7 &   0.0 &   0.0 &   0.0 \\
23.1 & 5698.53 & 1.06 &  -0.11 & 154.1 &   0.0 & 118.4 & 162.3 & 137.1 & 160.2 & 118.7 &   0.0 &   0.0 &   0.0 \\
23.1 & 5727.06 & 1.08 &  -0.01 & 166.6 &   0.0 & 129.9 & 173.5 & 160.1 & 180.7 & 167.8 &   0.0 &   0.0 &   0.0 \\
23.1 & 5737.06 & 1.06 &  -0.74 & 121.9 &   0.0 &  90.0 & 150.2 & 128.4 & 146.6 & 137.3 &   0.0 &   0.0 &   0.0 \\
23.1 & 5743.45 & 1.08 &  -0.97 & 108.7 & 104.3 &  92.2 & 134.9 & 103.5 & 134.1 & 121.6 &   0.0 &   0.0 &   0.0 \\
23.1 & 6251.82 & 0.29 &  -1.34 & 180.8 &   0.0 & 149.9 & 203.0 & 173.8 & 207.8 & 184.7 & 198.6 & 193.8 & 182.6 \\
24.1 & 5628.65 & 3.42 &  -0.77 &  49.3 &  43.9 &  62.3 &  51.3 &  33.1 &  50.6 &  66.5 &   0.0 &   0.0 &   0.0 \\
24.1 & 5783.07 & 3.32 &  -0.40 &  63.2 &  64.4 &  58.1 &  77.9 &  59.9 &  75.7 &  64.2 &   0.0 &   0.0 &   0.0 \\
24.1 & 5787.93 & 3.32 &  -0.08 &  86.2 &  91.2 &  76.5 & 102.9 &  95.2 & 119.4 &  98.8 &   0.0 &   0.0 &   0.0 \\
24.1 & 6330.10 & 0.94 &  -2.87 &  47.1 & 133.1 & 125.8 & 171.8 & 139.0 & 181.0 & 156.3 & 159.7 & 148.5 & 144.5 \\
26.1 & 5619.61 & 4.39 &  -1.49 &  60.5 &  54.7 &  55.8 &  63.0 &  63.1 &  61.0 &  71.9 &   0.0 &   0.0 &   0.0 \\
26.1 & 5635.83 & 4.26 &  -1.59 &  74.8 &  59.7 &  62.5 &  62.5 &  71.2 &  69.8 &  41.9 &   0.0 &   0.0 &   0.0 \\
26.1 & 5636.70 & 3.64 &  -2.53 &  76.6 &  60.5 &  63.0 &  65.5 &  61.9 &  52.5 &  79.9 &   0.0 &   0.0 &   0.0 \\
26.1 & 5650.00 & 5.10 &  -0.80 &  64.5 &  51.7 &  65.5 &  63.5 &  54.9 &  60.9 &  62.3 &   0.0 &   0.0 &   0.0 \\
26.1 & 5651.48 & 4.47 &  -1.79 &  40.0 &  41.0 &  44.7 &  47.0 &  46.7 &  46.9 &  46.7 &   0.0 &   0.0 &   0.0 \\
26.1 & 5652.33 & 4.26 &  -1.77 &  53.9 &  52.9 &  59.7 &  37.0 &  47.6 &  52.6 &  43.2 &   0.0 &   0.0 &   0.0 \\
26.1 & 5717.84 & 4.28 &  -0.98 &  91.8 &  90.2 &  76.8 & 105.5 & 104.1 &  91.5 &  97.1 &   0.0 &   0.0 &   0.0 \\
26.1 & 5731.77 & 4.26 &  -1.10 &  99.4 &  85.3 &  89.2 &  94.2 &  95.2 &  93.2 & 104.0 &   0.0 &   0.0 &   0.0 \\
26.1 & 5738.24 & 4.22 &  -2.24 &  51.3 &  41.9 &  41.6 &  51.7 &  47.2 &  42.8 &  58.3 &   0.0 &   0.0 &   0.0 \\
26.1 & 5741.86 & 4.26 &  -1.69 &  70.5 &  82.6 &  67.1 &  76.6 &  80.4 &  64.2 &  68.7 &   0.0 &   0.0 &   0.0 \\
26.1 & 5752.04 & 4.55 &  -0.92 &  85.2 &  82.8 &  67.7 &  94.7 &  80.3 &  68.4 &  84.2 &   0.0 &   0.0 &   0.0 \\
26.1 & 5775.09 & 4.22 &  -1.11 &  81.2 &  81.0 &  67.0 &  93.6 &  78.4 &  94.5 &  90.7 &   0.0 &   0.0 &   0.0 \\
26.1 & 5793.92 & 4.22 &  -1.62 &  80.6 &  68.4 &  64.5 &  68.8 &  67.0 &  77.4 &  63.8 &   0.0 &   0.0 &   0.0 \\
26.1 & 5806.73 & 4.61 &  -0.93 &  79.0 &  78.0 &  64.0 &  93.4 &  85.0 & 102.8 &  93.9 &   0.0 &   0.0 &   0.0 \\
26.1 & 5827.87 & 3.28 &  -3.16 &  65.7 &  61.1 &  47.8 &  75.2 &  58.0 &  86.6 &  62.3 &   0.0 &   0.0 &   0.0 \\
26.1 & 6151.62 & 2.18 &  -3.26 & 160.8 & 139.3 & 110.8 & 149.8 & 140.6 & 138.8 & 157.2 & 135.6 & 141.9 & 150.6 \\
26.1 & 6159.38 & 4.61 &  -1.88 &  39.2 &  35.6 &  23.3 &  29.4 &  40.8 &  43.3 &  29.0 &  25.1 &   0.0 &  45.0 \\
26.1 & 6165.36 & 4.14 &  -1.48 &  91.9 &  78.2 &  55.6 &  64.7 &  92.2 &  61.0 &  84.3 &  67.4 &  73.8 &  89.9 \\
26.1 & 6173.34 & 2.22 &  -2.84 & 173.5 & 166.6 & 128.2 & 168.1 & 156.2 & 156.1 & 169.4 & 165.9 & 160.5 & 159.0 \\
26.1 & 6187.40 & 2.83 &  -4.12 &  49.1 &  50.0 &  27.3 &   0.0 &  38.4 &  46.8 &  43.3 &  33.4 &   0.0 &  30.3 \\
26.1 & 6188.00 & 3.94 &  -1.60 &  94.6 & 103.1 &  61.2 &  87.7 & 103.2 &  85.3 & 105.7 &  75.3 &  86.3 &  92.2 \\
26.1 & 6200.32 & 2.61 &  -2.39 & 161.9 & 141.3 & 117.0 & 158.5 & 150.4 & 140.5 & 161.3 & 158.2 & 167.5 & 148.9 \\
26.1 & 6213.44 & 2.22 &  -2.54 & 192.0 & 164.4 & 161.0 & 200.6 & 169.1 & 185.6 & 183.8 & 185.6 & 181.5 & 161.3 \\
26.1 & 6219.29 & 2.20 &  -2.39 & 197.8 & 176.2 & 166.6 & 209.5 &   0.0 & 199.9 & 186.7 & 200.4 & 190.8 & 164.4 \\
26.1 & 6232.65 & 3.65 &  -1.21 & 148.6 & 140.1 & 125.9 & 154.3 &   0.0 & 139.1 & 149.8 & 145.7 & 148.8 & 138.7 \\
26.1 & 6240.65 & 2.22 &  -3.23 & 142.0 & 142.7 & 136.2 & 159.0 & 128.9 & 136.4 & 144.3 & 142.0 & 144.8 & 137.2 \\
26.1 & 6265.14 & 2.18 &  -2.51 & 208.5 & 158.2 & 174.6 & 218.9 & 174.3 & 216.1 & 193.2 & 218.7 & 199.3 & 178.4 \\
26.1 & 6270.23 & 2.86 &  -2.55 & 118.2 & 122.1 & 104.5 & 138.6 & 125.1 &   0.0 & 121.6 & 133.5 &  43.3 & 111.7 \\
26.1 & 6311.50 & 2.83 &  -3.16 &  95.9 &  96.4 &  93.9 & 115.8 &  97.1 & 105.4 & 101.7 & 126.5 & 111.1 &  96.2 \\
26.1 & 6315.81 & 4.07 &  -1.67 &  59.8 &  83.2 &  86.5 &  81.5 &  77.3 &  43.1 &  86.9 &  81.6 &  73.1 &  76.0 \\
26.1 & 6322.69 & 2.59 &  -2.38 & 157.7 & 136.0 & 141.5 & 165.0 & 143.7 & 170.5 & 149.5 & 172.0 & 153.3 & 135.7 \\
26.1 & 6330.85 & 4.73 &  -1.22 &  55.2 &  58.6 &  53.1 &  60.8 &  71.0 &  56.2 &  70.5 &  56.5 &  56.8 &  69.0 \\
26.1 & 6335.34 & 2.20 &  -2.28 & 218.7 & 169.6 & 196.6 & 188.0 & 105.9 & 205.2 & 211.9 & 216.0 & 192.9 & 197.1 \\
26.1 & 6353.84 & 0.91 &  -6.41 &  63.0 &  44.0 &  63.3 &  70.5 &  48.6 &  60.1 &  64.3 &  74.2 &  56.0 &  59.2 \\
26.1 & 6380.75 & 4.19 &  -1.34 &  97.5 &  56.2 &  82.7 &  99.5 &  79.9 &  98.6 &  87.3 & 106.6 &  83.3 &  86.6 \\
26.1 & 6392.54 & 2.28 &  -3.97 &   0.0 &  72.0 &  75.3 &  85.7 &  69.8 & 110.2 &  79.4 &  99.1 &  74.5 &  75.5 \\
26.2 & 6247.56 & 3.87 &  -2.32 &  40.1 &  35.7 &   0.0 &  36.2 &   0.0 &  33.3 &  42.2 &  33.8 &  43.1 &  25.7 \\
26.2 & 6369.46 & 2.89 &  -4.21 &   0.0 &  36.4 &  41.0 &  25.0 &  31.5 &  34.3 &  34.6 &  34.3 &  29.0 &  33.7 \\
28.1 & 5643.09 & 4.16 &  -1.25 &  35.3 &  33.3 &  31.6 &  36.7 &  34.2 &  40.4 &  38.6 &   0.0 &   0.0 &   0.0 \\
28.1 & 5709.56 & 1.68 &  -2.14 & 151.3 & 147.6 & 143.2 & 166.7 & 148.2 & 163.8 & 152.9 &   0.0 &   0.0 &   0.0 \\
28.1 & 5760.84 & 4.10 &  -0.81 &  65.3 &  82.8 &  60.0 &  71.2 &  65.5 &  65.9 &  76.6 &   0.0 &   0.0 &   0.0 \\
28.1 & 5805.23 & 4.17 &  -0.60 &  67.0 &  70.9 &  63.7 &  73.7 &  76.5 & 100.1 &  75.8 &   0.0 &   0.0 &   0.0 \\
28.1 & 6128.98 & 1.68 &  -3.39 & 136.7 & 118.5 &  76.4 & 123.1 & 116.1 & 123.8 & 136.3 & 110.8 & 112.1 & 124.1 \\
28.1 & 6130.14 & 4.26 &  -0.98 &  45.1 &  46.5 &  28.1 &  33.9 &  46.8 &  43.0 &  48.3 &  29.4 &  22.3 &  46.3 \\
28.1 & 6176.82 & 4.09 &  -0.24 & 108.9 & 102.9 &  66.6 &  86.4 &  98.3 &  93.7 & 111.4 &  67.3 &  93.4 &  99.6 \\
28.1 & 6177.25 & 1.83 &  -3.60 &  95.6 &  86.4 &  61.5 &  79.9 &  89.7 &  91.5 &  96.6 &  66.3 &  71.6 &  89.7 \\
28.1 & 6186.72 & 4.10 &  -0.90 &  63.0 &  77.3 &  42.0 &  47.3 &  74.8 &  74.1 &  74.1 &  48.7 &  51.2 &  77.5 \\
28.1 & 6204.61 & 4.09 &  -1.15 &  52.3 &  53.0 &  28.0 &  43.5 &  55.3 &  44.4 &  55.9 &  43.9 &  49.6 &  64.6 \\
28.1 & 6223.99 & 4.10 &  -0.97 &  49.3 &  34.1 &  31.5 &  42.5 &   0.0 &  49.9 &  41.5 &  30.2 &  46.3 &   0.0 \\
28.1 & 6230.10 & 4.10 &  -1.20 &  56.3 &  68.7 &  33.5 &  54.9 &   0.0 &  50.8 &  55.5 &  47.3 &  54.2 &  63.2 \\
28.1 & 6322.17 & 4.15 &  -1.21 &  38.0 &  39.6 &  26.3 &  26.9 &  44.5 &  25.0 &  34.3 &  33.5 &  34.3 &  37.2 \\
28.1 & 6327.60 & 1.68 &  -3.08 & 146.9 & 140.8 & 129.1 & 157.6 & 132.0 & 152.8 & 141.6 & 169.7 & 142.9 & 137.5 \\
28.1 & 6378.26 & 4.15 &  -0.82 &  54.8 &   0.0 &  55.0 &  60.4 &  54.2 &  71.2 &  55.2 &  75.2 &  52.4 &  64.3 \\
28.1 & 6384.67 & 4.15 &  -1.00 &  51.2 &  46.6 &  48.2 &  59.5 &   0.0 &  48.4 &  53.4 &  66.8 &  47.8 &  50.8 \\
56.1 & 6141.75 & 0.70 &   0.00 & 209.5 & 186.5 & 156.7 & 209.9 & 189.6 & 211.5 & 207.8 & 222.1 & 210.5 & 184.3 \\
\hline
\end{tabular}
\label{t:ewidths}
\normalsize
\end{table*}

\addtocounter{table}{-1}

\begin{table*}
\caption{Equivalent Widths from Giraffe spectra (in electronic form)}
\tiny
\begin{tabular}{lrrrrrrrr}
\hline
El   & Wavel.  & E.P. & log gf &8005158&8005404&8006535&8008693&8013657\\
     & (\AA)   & (eV) &        &(m\AA)~~&(m\AA)~~&(m\AA)~~&(m\AA)~~&(m\AA)~~\\
\hline
 8.1 & 6300.31 & 0.00 &  -9.75 &  58.0 &  82.0 &  54.0 &  50.0 &  55.4 \\
 8.1 & 6363.79 & 0.02 & -10.25 &  34.0 &  33.0 &  33.0 &  19.0 &  23.7 \\
11.1 & 6154.23 & 2.10 &  -1.57 &  92.7 &  80.3 &  94.1 & 165.0 &  86.1 \\
11.1 & 6160.75 & 2.10 &  -1.26 & 122.6 & 117.5 & 129.4 & 174.1 & 116.6 \\
12.1 & 5711.09 & 4.34 &  -1.71 &   0.0 & 171.7 & 139.0 &   0.0 &   0.0 \\
12.1 & 6318.71 & 5.11 &  -1.97 &  90.0 &  87.4 & 102.1 &   0.0 &  64.1 \\
12.1 & 6319.24 & 5.11 &  -2.20 &  67.5 &  75.1 &  90.7 &   0.0 &  56.3 \\
14.1 & 5645.62 & 4.93 &  -2.14 &   0.0 &  74.9 &  75.5 &  72.8 &   0.0 \\
14.1 & 5665.56 & 4.92 &  -2.04 &   0.0 &  59.9 &  67.8 &   0.0 &   0.0 \\
14.1 & 5684.49 & 4.95 &  -1.65 &   0.0 & 102.7 &  78.8 &  41.1 &   0.0 \\
14.1 & 5690.43 & 4.93 &  -1.87 &   0.0 &  76.7 &  60.7 &  45.1 &   0.0 \\
14.1 & 5793.08 & 4.93 &  -2.06 &   0.0 &  54.1 &  59.5 &  70.5 &   0.0 \\
14.1 & 6125.03 & 5.61 &  -1.57 &  52.9 &  31.0 &  48.7 &  94.3 &  55.8 \\
14.1 & 6145.02 & 5.61 &  -1.44 &  52.1 &  28.8 &  38.4 &   0.0 &  57.9 \\
20.1 & 6161.30 & 2.52 &  -1.27 & 164.4 & 163.9 & 172.8 & 192.5 & 121.7 \\
20.1 & 6166.44 & 2.52 &  -1.14 & 151.3 & 155.7 & 140.6 & 164.7 & 124.9 \\
20.1 & 6169.04 & 2.52 &  -0.80 & 168.8 & 177.6 & 187.2 & 201.6 & 144.5 \\
20.1 & 6169.56 & 2.52 &  -0.48 & 155.8 & 194.5 & 197.0 & 207.8 & 145.8 \\
21.2 & 5640.99 & 1.50 &  -0.86 &   0.0 & 125.3 & 110.0 &  94.1 &   0.0 \\
21.2 & 5667.15 & 1.50 &  -1.11 &   0.0 & 102.0 & 106.3 &  79.8 &   0.0 \\
21.2 & 5669.04 & 1.50 &  -1.00 &   0.0 &  21.1 & 103.3 &  93.2 &   0.0 \\
21.2 & 5671.83 & 1.45 &   0.56 &   0.0 & 152.6 & 145.7 &  81.1 &   0.0 \\
21.2 & 6245.62 & 1.51 &  -1.05 &  96.6 & 105.8 & 110.1 &  99.5 &  79.9 \\
21.2 & 6279.74 & 1.50 &  -1.16 &  73.1 &  64.4 &  96.5 &  91.9 &  50.5 \\
22.1 & 6126.22 & 1.07 &  -1.42 & 160.1 & 172.1 & 179.9 & 191.3 & 128.7 \\
23.1 & 5624.89 & 1.05 &  -1.07 &   0.0 & 137.7 & 114.1 &  92.3 &   0.0 \\
23.1 & 5626.01 & 1.04 &  -1.25 &   0.0 & 132.0 & 140.9 &  80.1 &   0.0 \\
23.1 & 5627.64 & 1.08 &  -0.37 &   0.0 & 173.0 & 146.9 &  83.7 &   0.0 \\
23.1 & 5657.44 & 1.06 &  -1.02 &   0.0 & 114.9 & 102.8 &  65.8 &   0.0 \\
23.1 & 5668.36 & 1.08 &  -1.02 &   0.0 & 111.0 & 130.3 &  69.2 &   0.0 \\
23.1 & 5670.86 & 1.08 &  -0.42 &   0.0 & 193.5 & 163.0 &  91.0 &   0.0 \\
23.1 & 5698.53 & 1.06 &  -0.11 &   0.0 & 234.6 & 183.3 & 150.4 &   0.0 \\
23.1 & 5727.06 & 1.08 &  -0.01 &   0.0 & 208.5 & 167.3 &  87.0 &   0.0 \\
23.1 & 5737.06 & 1.06 &  -0.74 &   0.0 & 140.3 & 138.2 & 107.3 &   0.0 \\
23.1 & 5743.45 & 1.08 &  -0.97 &   0.0 & 125.9 & 132.4 &  69.4 &   0.0 \\
23.1 & 6251.82 & 0.29 &  -1.34 & 162.1 & 190.7 & 217.7 &  58.5 & 146.8 \\
24.1 & 5628.65 & 3.42 &  -0.77 &   0.0 &  68.8 &  55.9 &  43.7 &   0.0 \\
24.1 & 5783.07 & 3.32 &  -0.40 &   0.0 &  86.1 &  66.1 & 104.1 &   0.0 \\
24.1 & 5787.93 & 3.32 &  -0.08 &   0.0 &  94.5 &  92.7 & 138.8 &   0.0 \\
24.1 & 6330.10 & 0.94 &  -2.87 & 141.3 & 167.9 & 192.7 & 198.4 & 114.5 \\
26.1 & 5619.61 & 4.39 &  -1.49 &   0.0 &  79.6 &  64.5 &  51.2 &   0.0 \\
26.1 & 5635.83 & 4.26 &  -1.59 &   0.0 &  78.9 &  87.1 &  63.8 &   0.0 \\
26.1 & 5636.70 & 3.64 &  -2.53 &   0.0 &  70.4 &  66.9 &  72.1 &   0.0 \\
26.1 & 5650.00 & 5.10 &  -0.80 &   0.0 &  59.5 &  77.0 &  39.0 &   0.0 \\
26.1 & 5651.48 & 4.47 &  -1.79 &   0.0 &  43.8 &  56.7 &  50.3 &   0.0 \\
26.1 & 5652.33 & 4.26 &  -1.77 &   0.0 &  54.6 &  61.6 &  61.6 &   0.0 \\
26.1 & 5717.84 & 4.28 &  -0.98 &   0.0 & 111.6 &  92.5 &  77.3 &   0.0 \\
26.1 & 5731.77 & 4.26 &  -1.10 &   0.0 &  98.2 &  97.4 &  64.9 &   0.0 \\
26.1 & 5738.24 & 4.22 &  -2.24 &   0.0 &  29.3 &  51.2 &  64.8 &   0.0 \\
26.1 & 5741.86 & 4.26 &  -1.69 &   0.0 &  63.6 &  71.5 &   0.0 &   0.0 \\
26.1 & 5752.04 & 4.55 &  -0.92 &   0.0 &  64.0 &  70.3 &  54.1 &   0.0 \\
26.1 & 5775.09 & 4.22 &  -1.11 &   0.0 &  90.5 &  89.5 &  56.3 &   0.0 \\
26.1 & 5793.92 & 4.22 &  -1.62 &   0.0 &  57.1 &  72.5 &  52.7 &   0.0 \\
26.1 & 5806.73 & 4.61 &  -0.93 &   0.0 &  62.6 &  62.5 &  55.5 &   0.0 \\
26.1 & 5827.87 & 3.28 &  -3.16 &   0.0 &  33.2 &  70.2 &  60.0 &   0.0 \\
26.1 & 6151.62 & 2.18 &  -3.26 & 146.4 & 136.6 & 143.3 & 168.7 & 102.5 \\
26.1 & 6159.38 & 4.61 &  -1.88 &  40.7 &  22.8 &  49.9 &  88.9 &  36.8 \\
26.1 & 6165.36 & 4.14 &  -1.48 &  84.1 &  64.0 &  64.1 & 100.1 &  81.3 \\
26.1 & 6173.34 & 2.22 &  -2.84 & 161.3 & 154.8 & 164.4 & 172.1 & 126.9 \\
26.1 & 6187.40 & 2.83 &  -4.12 &  41.0 &  30.1 &  45.5 &  36.8 &  36.6 \\
26.1 & 6188.00 & 3.94 &  -1.60 &  95.2 &  76.1 &  81.3 & 122.0 &  77.0 \\
26.1 & 6200.32 & 2.61 &  -2.39 & 149.1 & 152.9 & 135.0 & 147.4 & 118.6 \\
26.1 & 6213.44 & 2.22 &  -2.54 & 176.5 & 187.1 & 195.7 & 175.3 & 140.4 \\
26.1 & 6219.29 & 2.20 &  -2.39 & 182.9 & 186.9 & 200.4 & 197.5 & 149.8 \\
26.1 & 6232.65 & 3.65 &  -1.21 & 143.8 & 110.2 & 148.5 & 159.8 & 109.1 \\
26.1 & 6240.65 & 2.22 &  -3.23 & 125.1 & 147.6 & 155.6 & 139.6 & 107.5 \\
26.1 & 6265.14 & 2.18 &  -2.51 & 175.8 & 183.2 & 217.3 & 239.2 & 164.9 \\
26.1 & 6270.23 & 2.86 &  -2.55 & 124.8 & 121.9 & 133.0 &  27.3 &  96.9 \\
26.1 & 6311.50 & 2.83 &  -3.16 &  92.7 & 103.9 & 121.8 & 128.6 &  66.2 \\
26.1 & 6315.81 & 4.07 &  -1.67 &   0.0 &  73.0 &  82.0 &  90.7 &  48.5 \\
26.1 & 6322.69 & 2.59 &  -2.38 & 143.3 & 148.3 & 169.9 & 171.9 & 113.8 \\
26.1 & 6330.85 & 4.73 &  -1.22 &  40.9 &  66.4 &  60.2 & 100.9 &  48.3 \\
26.1 & 6335.34 & 2.20 &  -2.28 & 178.1 & 190.8 & 238.5 & 253.9 & 165.3 \\
26.1 & 6353.84 & 0.91 &  -6.41 &  44.5 &  53.7 &  83.7 & 100.5 &  46.1 \\
26.1 & 6380.75 & 4.19 &  -1.34 &  85.6 &  88.0 & 116.4 & 123.3 &  87.7 \\
26.1 & 6392.54 & 2.28 &  -3.97 &  67.2 &  75.6 & 101.0 & 106.2 &  78.8 \\
26.2 & 6247.56 & 3.87 &  -2.32 &  69.0 &  40.4 &  25.1 &  53.3 &  29.0 \\
26.2 & 6369.46 & 2.89 &  -4.21 &  34.5 &  31.2 &  31.9 &  51.3 &  32.0 \\
28.1 & 5643.09 & 4.16 &  -1.25 &   0.0 &  22.8 &  36.6 &  73.9 &   0.0 \\
28.1 & 5709.56 & 1.68 &  -2.14 &   0.0 & 257.1 & 172.7 &  21.1 &   0.0 \\
28.1 & 5760.84 & 4.10 &  -0.81 &   0.0 &  52.8 &  63.6 &  59.3 &   0.0 \\
28.1 & 5805.23 & 4.17 &  -0.60 &   0.0 &  50.9 &  76.2 &  53.5 &   0.0 \\
28.1 & 6128.98 & 1.68 &  -3.39 & 121.3 & 106.1 & 116.9 & 163.1 & 109.6 \\
28.1 & 6130.14 & 4.26 &  -0.98 &  43.2 &  27.7 &  43.3 &  81.5 &  52.6 \\
28.1 & 6176.82 & 4.09 &  -0.24 &  98.9 &  81.4 &  84.6 & 121.3 &  81.7 \\
28.1 & 6177.25 & 1.83 &  -3.60 &  86.7 &  70.0 &  80.1 & 125.1 &  82.7 \\
28.1 & 6186.72 & 4.10 &  -0.90 &  64.2 &  45.9 &  68.8 & 127.1 &  55.8 \\
28.1 & 6204.61 & 4.09 &  -1.15 &  46.5 &  29.9 &  44.4 &  92.4 &  50.9 \\
28.1 & 6223.99 & 4.10 &  -0.97 &  45.7 &  40.0 &  46.6 &  82.9 &  41.0 \\
28.1 & 6230.10 & 4.10 &  -1.20 &  48.2 &  42.3 &  50.7 &  98.8 &  59.5 \\
28.1 & 6322.17 & 4.15 &  -1.21 &  33.1 &  24.0 &  31.3 &  54.4 &  24.4 \\
28.1 & 6327.60 & 1.68 &  -3.08 & 129.5 & 149.7 & 170.9 & 171.1 & 129.1 \\
28.1 & 6378.26 & 4.15 &  -0.82 &  55.5 &  62.8 &  85.8 &  97.7 &  52.4 \\
28.1 & 6384.67 & 4.15 &  -1.00 &  49.4 &  45.9 &  72.2 &  97.7 &  42.3 \\
56.1 & 6141.75 & 0.70 &   0.00 & 194.8 & 205.2 & 210.2 & 213.9 & 178.2 \\
\hline
\end{tabular}
\normalsize
\end{table*}
