\nopagenumbers
\magnification=1000
\hoffset=2.0truecm
\voffset=0.0truecm\hsize= 6.25truecm
\vsize=26truecm
\pretolerance=10000
\tolerance=5000
\hyphenpenalty=100000
\hbadness=10000
\def\kms{km s$^{-1}$} 
\def\cc{$^{\circ}$}
\def\mm{$\mu$m}
\def\cm{cm$^{-1}$}
\def\s {s$^{-1}$~}
\def\arcs{$^{\prime\prime}$}
\def\arcsq{$^{\prime\prime}$$^2$}
\def\prim{$^{\prime}$}
\def\deg{$^{o}$}
\def\h{$^{h}$}
\def\mi{$^{m}$}
\def\se{$^{s}$}
\def\la{$\lambda$}
\def\L{$L_{\odot}$}
\def\ML{$M_{\odot}$ y$^{-1}$}
\def\MS{$M_{\odot}$}
\def\erg{erg cm$^{-2}$ s$^{-1}$}
\def\K{$^{\circ}K$}
\def\I{{\pr I}}
\def\II{{\pr II}}
\def\III{{\pr III}}
\def\IV{{\pr IV}}
 {\settabs   5\columns
\centerline{Table 2: FES magnitude and UV fluxes}
\vskip 0.5truecm\hrule width  6.75truecm
\vskip 0.05truecm\hrule width  6.75truecm
\vskip 0.3truecm\+ \hfill J.D.                              & 
\hfill mag                             & 
\hfill F(1455)                         & 
\hfill F(1835)                         & 
\hfill F(2885)                         &\cr 
\vskip 0.5truecm\hrule width  6.75truecm
\vskip 0.3truecm\+ \hfill    3717 & 
\hfill       8.35 & 
\hfill      55.10 & 
\hfill      30.90 & 
\hfill            &\cr \+ \hfill    3739 & 
\hfill       8.38 & 
\hfill      47.20 & 
\hfill      24.10 & 
\hfill       9.10 &\cr \+ \hfill    3795 & 
\hfill       8.54 & 
\hfill            & 
\hfill            & 
\hfill       8.30 &\cr \+ \hfill    3827 & 
\hfill       8.55 & 
\hfill      46.90 & 
\hfill      25.70 & 
\hfill            &\cr \+ \hfill    3877 & 
\hfill       8.56 & 
\hfill      50.00 & 
\hfill      26.60 & 
\hfill            &\cr \+ \hfill    4054 & 
\hfill       8.44 & 
\hfill      40.10 & 
\hfill      25.00 & 
\hfill      12.10 &\cr \+ \hfill    4076 & 
\hfill       8.45 & 
\hfill      45.00 & 
\hfill      26.30 & 
\hfill      13.80 &\cr \+ \hfill    4118 & 
\hfill       8.34 & 
\hfill      45.00 & 
\hfill      26.40 & 
\hfill      14.00 &\cr \+ \hfill    4132 & 
\hfill       8.42 & 
\hfill      41.10 & 
\hfill      26.70 & 
\hfill      15.10 &\cr \+ \hfill    4156 & 
\hfill       8.37 & 
\hfill      36.90 & 
\hfill      22.90 & 
\hfill            &\cr \+ \hfill    4222 & 
\hfill       8.34 & 
\hfill      43.00 & 
\hfill      23.00 & 
\hfill      15.70 &\cr \+ \hfill    4344 & 
\hfill            & 
\hfill      41.80 & 
\hfill            & 
\hfill      16.00 &\cr \+ \hfill    4385 & 
\hfill       8.33 & 
\hfill      38.80 & 
\hfill      26.00 & 
\hfill      14.00 &\cr \+ \hfill    4451 & 
\hfill       8.40 & 
\hfill      42.40 & 
\hfill      27.00 & 
\hfill            &\cr \+ \hfill    4536 & 
\hfill       8.46 & 
\hfill      33.30 & 
\hfill      19.80 & 
\hfill      10.90 &\cr \+ \hfill    4614 & 
\hfill       8.62 & 
\hfill      36.00 & 
\hfill      22.90 & 
\hfill      10.90 &\cr \+ \hfill    4735 & 
\hfill       8.65 & 
\hfill      35.00 & 
\hfill      18.10 & 
\hfill      10.40 &\cr \+ \hfill    4943 & 
\hfill       8.41 & 
\hfill      34.70 & 
\hfill      19.60 & 
\hfill      12.80 &\cr \+ \hfill    6213 & 
\hfill       8.55 & 
\hfill      20.80 & 
\hfill      16.40 & 
\hfill       8.80 &\cr \+ \hfill    6777 & 
\hfill       8.24 & 
\hfill      24.70 & 
\hfill      17.30 & 
\hfill      13.90 &\cr \+ \hfill    7786 & 
\hfill       8.60 & 
\hfill      20.00 & 
\hfill      11.10 & 
\hfill            &\cr \+ \hfill    7821 & 
\hfill       8.57 & 
\hfill            & 
\hfill      12.00 & 
\hfill       5.80 &\cr \+ \hfill    7828 & 
\hfill       8.56 & 
\hfill      16.80 & 
\hfill      11.70 & 
\hfill       6.00 &\cr \+ \hfill    8216 & 
\hfill       8.21 & 
\hfill      16.00 & 
\hfill      11.60 & 
\hfill       8.00 &\cr \+ \hfill    8471 & 
\hfill       8.15 & 
\hfill      16.00 & 
\hfill      13.40 & 
\hfill       8.90 &\cr \+ \hfill    8565 & 
\hfill       8.16 & 
\hfill      21.20 & 
\hfill      13.00 & 
\hfill       6.70 &\cr \+ \hfill    8921 & 
\hfill       8.53 & 
\hfill      12.90 & 
\hfill       9.90 & 
\hfill            &\cr \+ \hfill    8932 & 
\hfill            & 
\hfill      10.10 & 
\hfill      12.50 & 
\hfill       5.30 &\cr \+ \hfill    9127 & 
\hfill            & 
\hfill      14.50 & 
\hfill      11.00 & 
\hfill            &\cr \+ \hfill    9192 & 
\hfill       8.32 & 
\hfill      15.50 & 
\hfill      11.00 & 
\hfill       8.90 &\cr \+ \hfill    9255 & 
\hfill       8.32 & 
\hfill      16.20 & 
\hfill       9.10 & 
\hfill       9.20 &\cr \+ \hfill    9485 & 
\hfill            & 
\hfill      12.00 & 
\hfill       9.00 & 
\hfill       5.30 &\cr \+ \hfill    9638 & 
\hfill            & 
\hfill      11.00 & 
\hfill       8.10 & 
\hfill       3.30 &\cr \+ \hfill    9863 & 
\hfill            & 
\hfill      15.20 & 
\hfill       9.30 & 
\hfill       7.10 &\cr 
\vskip 0.3truecm\hrule width  6.75truecm
 } 
\vskip 0.3truecm
\par
\noindent
{\it Note}: Fluxes (observed) are in units 
of 10$^{-13}$ erg cm$^{-2}$ s$^{-1}$ A$^{-1}$.
\par
\noindent
JD = Julian Date - 2440000
\end  
