\magnification=1000
\hoffset=2.0truecm
\voffset=0.0truecm\hsize= 5.00truecm
\vsize=26truecm
\pretolerance=10000
\tolerance=5000
\hyphenpenalty=100000
\hbadness=10000
\def\kms{km s$^{-1}$} 
\def\cc{$^{\circ}$}
\def\mm{$\mu$m}
\def\cm{cm$^{-1}$}
\def\s {s$^{-1}$~}
\def\arcs{$^{\prime\prime}$}
\def\arcsq{$^{\prime\prime}$$^2$}
\def\prim{$^{\prime}$}
\def\deg{$^{o}$}
\def\h{$^{h}$}
\def\mi{$^{m}$}
\def\se{$^{s}$}
\def\la{$\lambda$}
\def\L{$L_{\odot}$}
\def\ML{$M_{\odot}$ y$^{-1}$}
\def\MS{$M_{\odot}$}
\def\erg{erg cm$^{-2}$ s$^{-1}$}
\def\K{$^{\circ}K$}
\def\I{{\pr I}}
\def\II{{\pr II}}
\def\III{{\pr III}}
\def\IV{{\pr IV}}
 {\settabs   4\columns
\centerline{Table 3a:  $N_e$ from the SiIII]/CIII] ratio}
\vskip 0.5truecm\hrule width  5.50truecm
\vskip 0.05truecm\hrule width  5.50truecm
\vskip 0.3truecm\+ \hfill J.D.                            & 
\hfill SiIII]                          & 
\hfill CIII]                           & 
\hfill ~~Log $N_e$                       &\cr 
\vskip 0.5truecm\hrule width  5.50truecm
\vskip 0.3truecm\+ \hfill    3717 & 
\hfill       1.29 & 
\hfill       2.36 & 
\hfill       9.85 &\cr \+ \hfill    3739 & 
\hfill       1.03 & 
\hfill       2.43 & 
\hfill       9.70 &\cr \+ \hfill    3827 & 
\hfill       0.51 & 
\hfill       1.46 & 
\hfill       9.60 &\cr \+ \hfill    3877 & 
\hfill       0.46 & 
\hfill       1.65 & 
\hfill       9.51 &\cr \+ \hfill    4054 & 
\hfill       0.63 & 
\hfill       1.39 & 
\hfill       9.73 &\cr \+ \hfill    4118 & 
\hfill       0.83 & 
\hfill       1.50 & 
\hfill       9.86 &\cr \+ \hfill    4132 & 
\hfill       0.85 & 
\hfill       1.30 & 
\hfill      10.00 &\cr \+ \hfill    4156 & 
\hfill       1.51 & 
\hfill       2.00 & 
\hfill      10.17 &\cr \+ \hfill    4222 & 
\hfill       1.70 & 
\hfill       1.98 & 
\hfill      10.37 &\cr \+ \hfill    4344 & 
\hfill       1.60 & 
\hfill       1.80 & 
\hfill      10.44 &\cr \+ \hfill    4385 & 
\hfill       1.72 & 
\hfill       2.00 & 
\hfill      10.38 &\cr \+ \hfill    4385 & 
\hfill       1.88 & 
\hfill       2.19 & 
\hfill      10.37 &\cr \+ \hfill    4536 & 
\hfill       0.68 & 
\hfill       1.38 & 
\hfill       9.78 &\cr \+ \hfill    4536 & 
\hfill       0.71 & 
\hfill       1.41 & 
\hfill       9.80 &\cr \+ \hfill    4614 & 
\hfill       0.70 & 
\hfill       1.53 & 
\hfill       9.74 &\cr \+ \hfill    4735 & 
\hfill       0.56 & 
\hfill       1.50 & 
\hfill       9.64 &\cr \+ \hfill    4943 & 
\hfill       0.87 & 
\hfill       1.46 & 
\hfill       9.92 &\cr \+ \hfill    6213 & 
\hfill       0.80 & 
\hfill       1.73 & 
\hfill       9.75 &\cr \+ \hfill    7786 & 
\hfill       0.75 & 
\hfill       0.92 & 
\hfill      10.28 &\cr \+ \hfill    7821 & 
\hfill       0.50 & 
\hfill       1.02 & 
\hfill       9.78 &\cr \+ \hfill    7828 & 
\hfill       0.59 & 
\hfill       0.95 & 
\hfill       9.96 &\cr \+ \hfill    8216 & 
\hfill       0.89 & 
\hfill       0.90 & 
\hfill      10.69 &\cr \+ \hfill    8471 & 
\hfill       1.30 & 
\hfill       0.98 & 
\hfill      12.00 &\cr \+ \hfill    8565 & 
\hfill       0.81 & 
\hfill       0.86 & 
\hfill      10.57 &\cr \+ \hfill    8921 & 
\hfill       0.40 & 
\hfill       0.61 & 
\hfill      10.01 &\cr \+ \hfill    8921 & 
\hfill       0.36 & 
\hfill       0.66 & 
\hfill       9.85 &\cr \+ \hfill    8932 & 
\hfill       0.45 & 
\hfill       0.76 & 
\hfill       9.92 &\cr \+ \hfill    9192 & 
\hfill       1.11 & 
\hfill       0.98 & 
\hfill      11.15 &\cr \+ \hfill    9255 & 
\hfill       1.10 & 
\hfill       0.82 & 
\hfill      12.08 &\cr \+ \hfill    9255 & 
\hfill       1.23 & 
\hfill       0.89 & 
\hfill      12.30 &\cr \+ \hfill    9485 & 
\hfill       0.43 & 
\hfill       0.63 & 
\hfill      10.05 &\cr \+ \hfill    9638 & 
\hfill       0.32 & 
\hfill       0.60 & 
\hfill       9.84 &\cr \+ \hfill    9638 & 
\hfill       0.29 & 
\hfill       0.54 & 
\hfill       9.84 &\cr \+ \hfill    9862 & 
\hfill       0.79 & 
\hfill       0.72 & 
\hfill      11.03 &\cr 
\vskip 0.3truecm
\hrule width  5.50truecm
 } 
\vskip 0.3truecm
\par
\noindent
{\it Note}: The observed fluxes of the SiIII] and CIII] 
lines in columns 2 and 3 are in units of 10$^{-11}$ erg
cm$^{-2}$ s$^{-1}$
 \end  
