\nopagenumbers
\magnification=1000
\hoffset=2.0truecm
\voffset=0.0truecm\hsize= 6.25truecm
\vsize=26truecm
\pretolerance=10000
\tolerance=5000
\hyphenpenalty=100000
\hbadness=10000
\def\kms{km s$^{-1}$} 
\def\cc{$^{\circ}$}
\def\mm{$\mu$m}
\def\cm{cm$^{-1}$}
\def\s {s$^{-1}$~}
\def\arcs{$^{\prime\prime}$}
\def\arcsq{$^{\prime\prime}$$^2$}
\def\prim{$^{\prime}$}
\def\deg{$^{o}$}
\def\h{$^{h}$}
\def\mi{$^{m}$}
\def\se{$^{s}$}
\def\la{$\lambda$}
\def\L{$L_{\odot}$}
\def\ML{$M_{\odot}$ y$^{-1}$}
\def\MS{$M_{\odot}$}
\def\erg{erg cm$^{-2}$ s$^{-1}$}
\def\K{$^{\circ}K$}
\def\I{{\pr I}}
\def\II{{\pr II}}
\def\III{{\pr III}}
\def\IV{{\pr IV}}
 {\settabs   5\columns
\centerline{Table 3b: $N_e$ from the NIII] multiplet}
\vskip 0.5truecm\hrule width  6.75truecm
\vskip 0.05truecm\hrule width  6.75truecm
\vskip 0.3truecm\+ \hfill J.D.                              & 
\hfill 1748.6                          & 
\hfill 1749.6                          & 
\hfill 1754.0                          & 
\hfill ~~Log $N_e$                         &\cr 
\vskip 0.5truecm\hrule width  6.75truecm
\vskip 0.3truecm\+ \hfill    3738 & 
\hfill       0.32 & 
\hfill       0.88 & 
\hfill       0.28 & 
\hfill      10.01 &\cr \+ \hfill    3131 & 
\hfill       0.29 & 
\hfill       0.82 & 
\hfill       0.28 & 
\hfill      10.05 &\cr \+ \hfill    4535 & 
\hfill       0.23 & 
\hfill       0.69 & 
\hfill       0.19 & 
\hfill       9.79 &\cr \+ \hfill    4613 & 
\hfill       0.18 & 
\hfill       0.67 & 
\hfill       0.25 & 
\hfill       9.58 &\cr \+ \hfill    4943 & 
\hfill       0.22 & 
\hfill       0.69 & 
\hfill       0.31 & 
\hfill       9.84 &\cr \+ \hfill    6776 & 
\hfill       0.38 & 
\hfill       0.97 & 
\hfill       0.34 & 
\hfill      10.22 &\cr \+ \hfill    7827 & 
\hfill       0.10 & 
\hfill       0.32 & 
\hfill       0.11 & 
\hfill       9.90 &\cr \+ \hfill    8215 & 
\hfill       0.20 & 
\hfill       0.47 & 
\hfill       0.26 & 
\hfill      10.57 &\cr \+ \hfill    8565 & 
\hfill       0.14 & 
\hfill       0.34 & 
\hfill       0.19 & 
\hfill      10.57 &\cr \+ \hfill    8921 & 
\hfill       0.13 & 
\hfill       0.24 & 
\hfill       0.10 & 
\hfill       9.76 &\cr \+ \hfill    8932 & 
\hfill       0.09 & 
\hfill       0.27 & 
\hfill       0.23 & 
\hfill      10.38 &\cr \+ \hfill    9862 & 
\hfill       0.17 & 
\hfill       0.40 & 
\hfill       0.22 & 
\hfill      10.83 &\cr \+ \hfill    9485 & 
\hfill       0.14 & 
\hfill       0.32 & 
\hfill       0.00 & 
\hfill      11.02 &\cr \+ \hfill    9862 & 
\hfill       0.17 & 
\hfill       0.40 & 
\hfill       0.22 & 
\hfill      10.83 &\cr \+ \hfill    9862 & 
\hfill       0.16 & 
\hfill       0.39 & 
\hfill       0.17 & 
\hfill      10.58 &\cr 
\vskip 0.3truecm
\hrule width  6.75truecm
 } 
\vskip 0.3truecm
\par
\noindent
{\it Note}: Observed fluxes of the NIII] lines are in 
units of 10$^{-11}$ erg  cm$^{-2}$ s$^{-1}$
 \end  
