\documentstyle{article}
\begin{document}

\newcommand{\degr}{^\circ}
\newcommand{\sun}{\odot}
\begin{table}[!ht]
%\renewcommand{\baselinestretch}{1.0}
\caption{Clump parameters (1)}
\begin{flushleft}
\begin{scriptsize}
\begin{tabular}{llllllllllll}
\noalign{\smallskip}
\hline
\noalign{\smallskip}
 Ncl & l & b & v & T$_{max}$ & $\Delta_ x$  & $\Delta_y$ & R &
$\Delta_v$ & M$_{\rm  CO}$ &M$_{grav}$&\\ 
&($\degr$) &($\degr$) &(km s$^{-1}$) & ($\degr$K) & (pc) & (pc) & (pc) & (km s$^{-1}$) & (M$_{\sun}$)
& (M$_{\sun}$) & COMPLEX\\
\noalign{\smallskip}
\hline\hline
\noalign{\smallskip}

1  & 192.312 & -11.375 & 9.43   & 13.42 & 5.13 & 4.31 & 4.60 & 1.73 & 1966.5 & 868.2 &B30\\
2  & 196.938 & -10.312 & 12.03  & 10.75 & 1.18 & 1.08 & 1.44 & 1.66 & 218.9  & 250.3 &B35\\
3  & 195.000 & -16.688 & -2.28  & 9.36  & 2.90 & 2.08 & 2.55 & 2.25 & 727.3  & 810.9 & B223\\
4  & 195.250 & -16.375 & -0.33  & 9.35  & 2.66 & 2.20 & 2.62 & 4.14 & 853.7  & 2823.4 & B223\\
5  & 198.625 & -9.000  &  11.38 & 8.89  & 1.91 & 1.56 & 2.07 & 2.53 & 395.3  & 831.4 &L1598\\
6  & 195.062 & -16.938 & -2.93  & 8.67  & 1.70 & 1.41 & 1.56 & 1.80 & 247.2  & 317.1 & B223\\
7  & 195.188 & -16.938 & -2.93  & 8.51  & 1.09 & 2.11 & 1.71 & 2.45 & 422.1  & 640.1&B223 \\
8  & 199.188 & -10.438 & 10.08  & 7.99  & 1.26 & 2.04 & 1.75 & 1.58 & 215.7  & 275.7&L1598\\
9  & 191.062 & -16.750 & 0.98   & 7.24  & 2.44 & 2.43 & 2.17 & 1.50 & 215.4  & 306.5&-\\
10 & 194.375 & -16.438 &  0.98  &  6.22 & 1.70 & 1.38 & 1.88 & 2.58 & 127.1  & 785.8&B223\\
11 & 198.125 & -15.250 & -0.98  &  6.04 & 1.74 & 0.68 & 1.51 & 1.74 & 124.2  & 286.2&B223\\
12 & 200.500 & -10.562 & 12.03  &  6.01 & 2.04 & 4.15 & 3.05 & 1.96 & 424.6  & 739.2&Spur\\
13 & 192.500 & -12.312 &  8.13  & 5.66  & 2.31 & 2.48 & 1.83 & 2.02 & 132.8  & 471.0&B30\\
14 & 197.188 & -10.125 & 11.38  & 5.52  & 1.34 & 1.49 & 1.45 & 1.20 & 84.5   & 130.7&B35\\
15 & 194.812 & -15.562 & -0.98  & 5.41  & 1.89 & 1.19 & 1.79 & 2.62 & 188.0  & 771.9&B223\\
16 & 192.438 & -12.188 & 12.68  &  5.39 & 1.51 & 1.83 & 1.87 & 2.57 & 146.7  & 776.0&B30\\
17 & 194.500 & -15.750 & -1.63  &  5.31 & 1.39 & 2.54 & 1.82 & 1.64 & 118.5  & 308.3&B223\\
18 & 199.688 & -11.750 & 12.68  &  5.26 & 1.90 & 1.68 & 2.06 & 2.05 & 195.5  & 543.2&Spur\\
19 & 196.812 & -16.062 & -1.63  &  5.23 & 2.43 & 1.19 & 1.97 & 1.92 & 193.3  & 457.6&B223 \\    
20 & 196.250 & -15.500 &  2.93  &  5.10 & 0.99 & 2.48 & 1.99 & 3.30 & 269.3  & 1354.5&B223 \\  
21 & 198.938 &  -9.750 &  8.78  &  5.03 & 1.14 & 2.29 & 1.69 & 1.96 & 183.5  & 409.1&L1598 \\    
22 & 198.688 &  -9.375 &  9.43  &  4.86 & 0.89 & 1.56 & 1.47 & 1.63 & 102.8  & 246.1&L1598\\     
23 & 197.125 & -15.938 & -0.98  &  4.63 & 0.79 & 1.55 & 1.52 & 2.68 & 126.7  & 683.3&B223\\  
24 & 199.875 & -11.438 & 12.03  &  4.56 & 1.24 & 1.75 & 1.70  & 1.57 & 109.9  & 262.7&Spur\\
25 & 197.438 & -15.438 & -0.33  &  4.52 & 1.97 & 1.61 & 1.96 & 2.00 & 162.2  & 493.5&B223\\
26 & 200.312 & -10.938 & 12.68  &  4.48 & 0.26 & 0.98 & 0.99 & 1.61 & 61.3   & 161.9&Spur\\
27 & 192.938 & -8.750  & 11.38  &  4.41 & 1.28 & 1.02 & 1.49 & 1.40 & 63.3   & 183.7&NR\\
28 & 196.062 &  -9.188 &  8.78  &  4.10 & 0.76 & 1.25 & 1.33 & 1.17 & 44.6   & 113.1&NR\\
29 & 193.938 & -16.312 &  2.93  &  3.90 & 0.99 & 0.75 & 1.00 & 1.74 & 56.9   & 190.3&B223\\
30 & 196.062 &  -8.250 & 12.03  &  3.84 & 0.92 & 0.71 & 1.09 & 1.45 & 45.3   & 142.6&NR\\
31 & 194.250 & -16.062 &  1.63  &  3.83 & 0.96 & 0.57 & 1.09 & 1.49 & 47.0   & 151.8&B223\\    
32 & 198.062 &  -9.812 & 12.68  &  3.79 & 0.11 & 0.73 & 0.94 & 1.08 & 31.0   & 69.5&B35\\       
33 & 194.312 & -15.500 & -1.63  &  3.77 & 1.06 & 0.86 & 1.20 & 1.21 & 42.8   & 109.2&B223\\      
34 & 195.625 &  -9.500 &  8.13  &  3.66 & 1.07 & 1.54 & 1.37 & 1.11 & 46.2   & 105.2&NR\\     
35 & 194.750 & -10.125 & 15.28  &  3.49 & 1.69 & 0.73 & 1.54 & 1.68 & 64.0   & 272.4&NR\\   
36 & 193.500 & -15.375 & -0.98  &  3.48 & 0.54 & 0.87 & 1.11 & 1.99 & 37.9   & 274.4&B223\\ 
37 & 197.938 &  -9.312 & 11.38  &  3.12 & 0.97 & 0.55 & 1.13 & 1.50 & 32.4   & 160.0&B35\\     
38 & 198.875 & -14.062 &  2.28  &  3.05 & 0.72 & 0.36 & 1.06 & 2.67 & 63.2   & 470.6&Arm \\     
39 & 194.188 & -15.062 & -0.33  &  3.00 & 0.06 & 0.81 & 1.03 & 1.84 & 36.9   & 220.0&B223\\     
40 & 199.125 & -12.062 & 13.33  &  2.96 & 0.97 & 0.58 & 0.94 & 1.28 & 31.8   & 97.1&Spur\\  
41 & 193.938 & -15.875 &  9.43  &  2.88 & 0.70 & 2.23 & 1.79 & 1.35 & 68.5   & 204.5& B223\\    
42 & 198.625 & -13.750 &  2.93  &  2.85 & 0.49 & 1.43 & 1.20 & 2.04 & 50.0   & 312.9&Arm\\     
43 & 191.000 & -14.812 &  2.28  &  2.83 & 0.58 & 1.26 & 0.78 & 1.38 & 22.6   & 92.5&SW\\   
44 & 200.938 & -13.312 & -0.33  &  2.77 & 0.58 & 2.00 & 1.18 & 2.84 & 49.9   & 598.8&Arm\\  
45 & 192.750 & -13.125 &  8.13  &  2.77 & 0.55 & 1.34 & 1.28 & 1.59 & 38.6   & 202.4&B30\\    
46 & 195.875 &  -7.938 & 11.38  &  2.75 & 1.61 & 0.99 & 1.40 & 0.91 & 33.4   & 72.5&NR\\     
47 & 193.938 & -16.500 &  1.63  &  2.73 & 0.99 & 0.58 & 1.02 & 2.04 & 48.2   & 266.6&B223\\ 
48 & 194.250 & -7.938  & 10.73  &  2.70 & 0.28 & 2.23 & 1.46 & 1.62 & 47.4   & 241.8&NR\\  
49 & 191.188 & -10.938 &   8.78 &  2.68 & 2.59 & 3.92 & 2.98 & 2.01 & 160.6  & 755.2&B30\\     
50 & 196.688 & -15.938 &  0.98  &  2.58 & 2.44 & 0.71 & 1.80 & 2.59 & 102.1  & 760.0&B223\\  
51 & 191.375 & -10.688 & 10.08  &  2.53 & 3.52 & 2.07 & 2.36 & 1.52 & 106.9  & 343.0&B30\\    
52 & 196.812 &  -8.188 & 10.08  &  2.51 & 1.13 & 1.16 & 1.39 & 1.70 & 37.2   & 252.3&NR\\     
53 & 199.250 & -10.938 &  9.43  &  2.49 & 1.15 & 0.31 & 0.74 & 0.86 & 13.5   & 33.9&L1598\\   
54 & 200.688 & -12.312 & 11.38  &  2.42 & 1.27 & 0.58 & 0.71 & 1.03 & 17.2   & 46.9&Spur\\   
55 & 199.938 & -10.812 & 10.08  &  2.38 & 1.32 & 1.99 & 1.71 & 1.84 & 49.7   & 364.1&NR\\     
56 & 201.000 &  -9.750 &  10.73 &  2.34 & 2.38 & 1.73 & 1.80 & 2.22 & 59.4   & 559.0 &Spur\\     
57 & 197.938 &  -8.375 &  10.73 &  2.32 & 1.16 & 0.58 & 1.00 & 1.40 & 26.3   & 123.9&NR\\   
58 & 192.312 & -12.500 &   8.13 &  2.30 & 0.58 & 0.79 & 0.88 & 1.01 & 18.8   & 55.8&B30\\   
59 & 194.750 &  -7.938 &  10.73 &  2.26 & 0.58 & 1.03 & 1.01 & 2.40 & 34.3   & 365.1&NR\\ 
60 & 194.375 & -15.625 &   2.28 &  2.24 & 0.58 & 0.58 & 0.60 & 1.21 & 16.2   & 54.54&B223\\
\end{tabular}
\end{scriptsize}
\end{flushleft}
\end{table} 

\begin{table}[!ht]
%\renewcommand{\baselinestretch}{1.0}
\caption{Clump parameters (2)}
\begin{flushleft}
\begin{scriptsize}
\begin{tabular}{lllllllllllll}
\noalign{\smallskip}
\hline
\noalign{\smallskip}
 Ncl & l & b & v & T$_{max}$ &$\Delta_ x$  & $\Delta_y$ & R
&$\Delta_v$ & M$_{\rm CO}$ & M$_{grav}$& \\ 
&$(\degr)$ &$(\degr)$ &(km s$^{-1}$) & ($\degr$K) & (pc) & (pc) & (pc) 
& (km s$^{-1}$) & (M$_{\sun}$) & (M$_{\sun}$)& COMPLEX\\
\noalign{\smallskip}
\hline\hline
\noalign{\smallskip}
61 & 193.438 & -15.562 & -1.63 & 2.22 &  0.58 & 0.33 & 0.65 & 1.18 & 17.3   & 56.8&B223\\
62 & 196.562 & -7.812  & -0.73 & 2.21 &  1.98 & 1.02 & 1.61 & 0.81 & 36.3   & 66.8&NR\\  
63 & 195.188 & -15.938 & -0.98 & 2.19 &  2.61 & 1.62 & 2.09 & 4.29 & 131.8  & 2412.1&B223\\
64 & 192.000 & -12.062 & 10.73 & 2.15 &  3.13 & 2.20 & 2.30 & 3.18 & 90.4   & 1458.8&B30\\
65 & 193.938 & -15.562 & -2.93 & 2.13 &  0.36 & 0.51 & 0.93 & 1.74 & 19.0   & 176.0&B223\\
66 & 195.312 & -8.750  & 4.88  & 2.09 &  0.41 & 0.87 & 1.00 & 0.87 & 15.8   & 47.9&NR\\
67 & 193.000 & -16.438 & 2.28  & 2.07 &  0.65 & 0.79 & 1.06 & 1.02 & 22.9   & 69.0&B223\\
68 & 196.125 & -16.062 & -2.28 & 2.04 &  1.46 & 1.27 & 1.73 & 3.52 & 103.4  & 1346.0&B223\\
69 & 198.375 & -8.750  & 8.13  & 2.02 &  2.33 & 1.07 & 1.59 & 2.21 & 38.9   & 487.0&L1598\\
70 & 197.938 & -8.000  & 10.08 & 1.97 &  0.58 & 0.58 & 1.01 & 2.02 & 26.5   & 259.6&NR\\
71 & 196.375 & -8.312  & 9.43  & 1.92 &  1.10 & 1.18 & 1.21 & 1.66 & 19.4   & 209.0&NR\\
72 & 191.500 & -13.625 & 2.93  & 1.91 &  1.53 & 0.55 & 1.44 & 2.22 & 48.8   & 445.9&SW\\
73 & 192.500 & -10.750 & 10.73 & 1.89 &  2.07 & 1.67 & 1.94 & 2.35 & 50.1   & 674.8&B30\\
74 & 193.250 & -16.312 & 1.63  & 1.83 &  0.57 & 0.41 & 0.94 & 1.24 & 15.5   & 91.1& B223\\
75 & 191.062 & -12.188 & 4.88  & 1.83 &  0.58 & 0.58 & 0.46 & 1.96 & 16.5   & 111.1& SW\\
76 & 193.062 & -15.375 & 2.28  & 1.81 &  0.58 & 0.29 & 0.87 & 1.54 & 21.3   & 130.1&B223\\
77 & 196.562 & -9.562  & 15.93 & 1.78 &  0.58 & 0.58 & 0.32 & 0.68 & 4.7    & 9.3&NR\\
78 & 198.438 & -10.188 & 10.08 & 1.78 &  1.37 & 2.35 & 1.43 & 1.51 & 19.9   & 206.9&B35\\
79 & 197.625 & -9.688  & 12.03 & 1.76 &  1.34 & 1.47 & 1.37 & 1.06 & 22.5   & 97.1&B35\\
80 & 195.688 & -9.125  &  8.13 & 1.74 &  0.13 & 0.54 & 0.88 & 1.27 & 16.6   & 89.0&NR\\
81 & 193.125 & -16.188 &  2.93 & 1.70 &  0.67 & 0.58 & 0.78 & 1.31 & 15.4   & 84.7&B223\\
82 & 199.938 & -13.188 &  0.98 & 1.70 &  0.58 & 0.70 & 0.96 & 1.51 & 20.3   & 137.7&Arm\\
83 & 192.438 & -12.750 &  5.53 & 1.70 &  0.58 & 0.29 & 0.74 & 1.09 & 11.8   & 55.0&B30\\
84 & 192.750 &-12.812  &  6.83 & 1.70 &  0.79 & 0.32 & 0.92 & 0.98 & 15.2   & 55.23&B30\\
85 & 191.125 &-15.188  &  1.63 & 1.68 &  0.69 & 0.29 & 0.99 & 1.47 & 22.8   & 134.8&SW\\
86 & 191.188 & -13.312 &  2.28 & 1.68 &  0.58 & 1.02 & 1.02 & 1.77 & 15.3   & 200.0&SW\\
87 & 199.625 & -9.688  & 10.73 & 1.59 &  0.50 & 0.26 & 0.97 & 1.35 & 12.5   & 111.2&L1598\\
88 & 195.875 & -16.000 & -1.63 & 1.58 &  2.07 & 1.51 & 1.84 & 3.63 & 68.1   & 1522.8&B223\\
89 & 196.438 &-15.750  &  4.88 & 1.55 &  1.14 & 1.99 & 1.68 & 2.38 & 41.5   & 598.2&B223\\
90 & 191.500 & -13.688 & -0.98 & 1.54 &  0.58 & 0.47 & 0.85 & 1.46 & 14.3   & 113.0&SW\\
91 & 198.688 & -12.000 & 13.33 & 1.54 &  1.60 & 0.93 & 1.43 & 1.52 & 36.6   & 207.3&Spur \\
92 &198.312  &-13.500  &  0.98 & 1.54 &  0.69 & 0.58 & 0.81 & 1.68 & 13.9   & 144.8&Arm\\
93 & 192.562 & -14.688 &  2.93 & 1.53 &  0.23 & 0.64 & 0.95 & 1.12 & 12.8   & 74.9&SW\\
94 & 191.000 & -15.812 &  3.58 & 1.53 &  0.58 & 0.58 & 0.24 & 1.06 & 5.6    & 17.1& SW\\
95 & 199.438 &  -9.875 & 10.08 & 1.52 &  1.47 & 1.21 & 1.13 & 1.49 & 14.1   & 157.7&L1598\\
96 & 197.750 & -8.188  &  9.43 & 1.51 &  2.07 & 1.19 & 1.39 & 1.49 & 24.1   & 195.1&NR\\
97 & 194.500 &  -7.688 & 13.98 & 1.48 &  1.12 & 0.58 & 0.75 & 1.16 & 9.6    & 63.6&NR\\
98 & 191.875 &  -13.312&  8.78 & 1.45 &  0.58 & 0.19 & 0.71 & 1.49 & 10.7   & 99.4&SW\\
99 & 198.438 &  -13.375&  4.88 & 1.43 &  0.58 & 0.58 & 0.67 & 1.70 & 11.9   & 122.4 &Arm\\
100&192.625  & -10.750 & 15.28 & 1.43 &  0.58 & 0.58 & 0.30 & 1.04 & 6.2    & 20.6 & B30\\
101&191.750  &-12.875  &  8.78 & 1.41 &  0.58 & 0.39 & 0.72 & 1.44 & 10.1   & 94.8&SW\\
102&192.750  &  -13.812& -2.28 & 1.38 &  0.68 & 1.25 & 0.98 & 1.24 & 13.8   & 94.6&SW\\
103&199.125  & -13.750 &  2.93 & 1.34 &  0.99 & 0.58 & 1.10 & 0.95 & 13.8   & 62.6&Arm\\
104&192.938  & -14.312 &  6.83 & 1.33 &  0.58 & 0.52 & 0.74 & 1.92 & 8.5    & 172.4&SW\\
105&197.625  &  -11.750& 12.68 & 1.31 &  1.63 & 0.58 & 1.08 & 1.40 & 12.9   & 131.9&Spur\\
106&200.375  & -11.562 & 12.03 & 1.27 &  0.79 & 2.49 & 1.34 & 1.14 & 14.4   & 108.2 &Spur\\
107&197.062  &  -8.500 & 11.38 & 1.27 &  1.16 & 0.72 & 1.14 & 2.13 & 15.7   & 325.2&NR\\
108&191.500  & -15.062 & -1.63 & 1.26 &  1.12 & 1.82 & 1.06 & 1.91 & 13.5   & 243.7 &SW\\
109&196.312  & -15.188 &  0.98 & 1.26 &  1.00 & 0.16 & 1.06 & 2.70 & 12.1   & 483.2 &B223\\
110&198.438  &  -9.188 & 13.98 & 1.24 &  0.67 & 0.58 & 1.03 & 2.23 & 17.1   & 323.7 &L1598\\
111&200.812  &  -9.125 &  6.83 & 1.24 &  0.58 & 0.58 & 0.40 & 0.62 & 3.5    & 9.8 &Spur\\
112&195.750  & -17.250 &  1.63 & 1.22 &  0.58 & 0.58 & 0.41 & 0.99 & 4.7    & 25.1&B223\\
113&200.562  & -13.750 &  2.28 & 1.20 &  1.67 & 0.58 & 1.07 & 1.19 & 10.1   & 95.8&Arm\\
114&196.812  & -9.500  & 14.63 & 1.20 &  0.58 & 0.58 & 0.65 & 0.86 & 6.0    & 30.4&NR\\
115&192.500  &-13.000  & 10.08 & 1.18 &  0.58 & 0.58 & 0.61 & 1.69 & 5.5    & 108.5&B30\\
116&193.438  &  -7.062 &  0.33 & 1.16 &  0.58 & 0.58 & 0.27 & 0.68 & 3.2    & 7.8&NR\\
117&199.750  & -12.438 & 13.33 & 1.14 &  0.39 & 1.89 & 1.05 & 2.04 & 10.4   & 274.8&Spur\\
118&191.062  & -14.062 &  4.88 & 1.12 &  0.58 & 0.58 & 0.30 & 1.19 & 3.8    & 26.4&SW\\
119&194.312  & -10.688 &  0.98 & 1.09 &  0.58 & 0.58 & 0.64 & 0.85 & 6.0    & 29.1&NR\\
120&196.125  &  -8.562 & 10.08 & 1.08 &  0.58 & 0.58 & 0.21 & 0.95 & 3.0    & 12.1&NR\\

\end{tabular}
\end{scriptsize}
\end{flushleft}
\end{table}

\begin{table}[!ht]
%\renewcommand{\baselinestretch}{1.0}
\caption{Clump parameters (3)}
\begin{flushleft}
\begin{scriptsize}
\begin{tabular}{lllllllllllll}
\noalign{\smallskip}
\hline
\noalign{\smallskip}
 Ncl & l & b & v & T$_{max}$ &$\Delta_ x$  & $\Delta_y$ & R
&$\Delta_v$ & M$_{\rm CO}$ & M$_{grav}$&\\ &$(\degr)$ &$(\degr)$ &(km s$^{-1}$) & ($\degr$K) & (pc) &
(pc) & (pc) & (km s$^{-1}$) & (M$_{\odot}$)  & (M$_{\odot}$) &COMPLEX\\
\noalign{\smallskip}
\hline\hline
\noalign{\smallskip}
121 & 197.625 & -15.688 &  3.58 &  1.08 &  0.58 & 0.58 & 0.48 & 1.49 &4.2  & 66.6&B223\\
122 & 200.188 & -13.062 &  0.98 &  1.06 &  0.66 & 0.58 & 0.65 & 0.94 &5.6  & 35.9&Arm\\
123 & 196.938 & -8.750  & 14.63 &  1.05 &  0.58 & 0.58 & 0.30 & 0.65 &1.7  & 8.0&NR\\
124 & 198.625 & -13.062 &  6.18 &  1.05 &  0.58 & 0.66 & 0.89 & 0.76 &6.4  & 31.9&Arm\\
125 & 191.062 & -12.750 &  2.28 &  1.05 &  0.58 & 0.58 & 0.43 & 1.12 &5.4  & 33.6&SW\\
126 & 200.938 & -10.000 &  9.43 &  1.02 &  1.89 & 2.44 & 1.69 & 2.55 &28.2 & 689.9&Spur\\
127 & 199.688 & -13.500 &  6.83 &  1.01 &  0.58 & 0.58 & 0.67 & 1.24 &4.8  & 64.4&Arm\\
128 & 194.125 & -12.375 &  0.98 &  1.01 &  0.78 & 0.58 & 0.83 & 0.86 &5.5  & 38.4 &Interior\\
129 & 192.875 & -15.625 &  2.28 &  1.00 &  0.58 & 0.58 & 0.51 & 0.99 &4.4  & 31.6&B223\\
130 & 192.938 & -7.062  &  4.23 &  1.00 &  0.58 & 0.58 & 0.38 & 0.90 &3.5  & 19.3&NR\\
\end{tabular}
\hline\hline
\end{scriptsize}
\end{flushleft}
\end{table}

\end{document}
