\def\caption#1{{\bf #1}}}
%\begin{table}
\caption{Log of MIDI observations: IRAS 09149-6206}
\begin{tabular}{| c c c c c c c c c c c c c c c}
\hline\hline
\multicolumn{8}{c}{Fringe track} & \multicolumn{3}{c}{FT QC} & PH & PH QC & \multicolumn{2}{c}{Calibration} \\
time & s & NDIT & BL & PA & g & mode & am & see & O & NGOOD & o3 & A/B & O & caltime & $\Delta$am \\
\hline
\hline
\multicolumn{15}{l}{2009-03-14: U1U2} \\
00:29:02 &  1 &  8000 &  49 &  12 & P & FT\_OF & 1.4 & 1.3 &  1 &  7009 &  0.53 & 1/1 &  0 & 23:58:48 &     -0.2\\
00:39:49 &  0 &  8000 &  49 &  14 & P & FT\_OF & 1.3 & 1.3 &  1 &  7024 &  0.44 & 1/1 &  1 & 23:58:48 &     -0.2\\
\hline
\multicolumn{15}{l}{2009-05-07: U3U4} \\
00:25:35 &  0 &  8000 &  62 & 126 & P & FT\_OF & 1.3 & 1.2 &  1 &  5261 &  0.54 & 2/1 &  0 & 23:55:01 &      0.2\\
01:45:20 &  1 &  8000 &  62 & 144 & P & FT\_OF & 1.5 & 1.4 &  1 &  6234 &  0.47 & 1/1 &  1 & 23:55:01 &      0.3\\
02:01:43 &  0 &  8000 &  62 & 147 & P & FT\_OF & 1.5 & 1.7 &  1 &  5238 &  0.61 & 2/1 &  1 & 23:55:01 &      0.4\\
\hline
\multicolumn{15}{l}{2009-05-08: U1U3} \\
00:18:43 &  1 &  8000 &  80 &  53 & P & FT\_OF & 1.3 & 0.8 &  1 &  4607 &  0.52 & 1/1 &  0 & 00:04:16 &      0.2\\
00:30:37 &  0 &  8000 &  78 &  55 & P & FT\_OF & 1.3 & 0.7 &  1 &  5297 &  0.49 & 1/1 &  1 & 00:04:16 &      0.2\\
\hline
\multicolumn{15}{l}{2009-05-10: U1U4} \\
23:38:10 &  1 &  8000 & 119 &  77 & P & FT\_OF & 1.3 & 0.9 &  1 &  7455 &  0.51 & 1/1 &  1 & 23:05:50 &      0.1\\
23:49:33 &  0 &  8000 & 117 &  79 & P & FT\_OF & 1.3 & 0.7 &  1 &  7476 &  0.55 & 1/1 &  1 & 23:05:50 &      0.1\\
\hline
\end{tabular}
%\end{table}
