\documentstyle{article}
\textheight 10in
\textwidth 7in
\topmargin -0.75in
\oddsidemargin -0.5in
\evensidemargin -0.5in
\pagestyle{empty}
%\input text:symdef.tex

\begin{document}

\setcounter{table}{0}
\begin{table}
\centering

\caption{Positions, Velocities and Line Strengths for Baade's Window M Stars}
\vspace*{0.25in}
\begin{tabular}{rccccrrrrcccc}
 &  &  &  &  & \multicolumn{2}{c}{Blue} &
\multicolumn{2}{c}{Red} & TiO & CaII \\
 BMB & I & Sp & RA (1950) & Dec (1950) & 
\multicolumn{1}{c}{V} & \multicolumn{1}{c}{$\epsilon$} &
\multicolumn{1}{c}{V} & \multicolumn{1}{c}{$\epsilon$} &
 8415 & 8662 & J-K & $M_{bol}$ \\
\multicolumn{1}{c}{(1)} & (2) & (3) & (4) &   (5) &
\multicolumn{1}{c}{(6)} &
\multicolumn{1}{c}{(7)} &
\multicolumn{1}{c}{(8)} &
\multicolumn{1}{c}{(9)} &
(10) & (11) & (12) & (13) \\[0.5cm]
   1  & 13.3 & 6.5 & 17\ 59\ 32.98 & -30\ 05\ 17.9 &  249.2 &  9.3 &   195.9 &  1.7  & 0.432 &    2.59 &       &        \\         
   2  & 12.9 & 6.5 & 17\ 59\ 33.61 & -30\ 04\ 55.9 &   98.5 &  8.1 &   113.6 &  1.1  & 0.464 &    1.41 &       &        \\         
   3  & 13.7 & 7.0 & 17\ 59\ 33.32 & -30\ 01\ 17.0 &        &      &   -34.0 &  5.9  &       &         &       &        \\         
   4  & 12.2 & 6.0 & 17\ 59\ 34.67 & -30\ 05\ 50.5 &   -8.1 &  7.7 &   -20.3 &  1.8  & 0.370 &    1.94 &       &        \\         
   6  & 12.6 & 6.0 & 17\ 59\ 37.08 & -29\ 58\ 58.7 &  -44.8 &  7.0 &   -27.1 &  4.5  & 0.288 &    2.22 &       &        \\         
   7  & 13.1 & 7.0 & 17\ 59\ 38.78 & -30\ 00\ 19.0 &        &      &    12.9 &  4.1  & 0.363 &    1.15 &       &        \\         
   8  & 13.6 & 6.0 & 17\ 59\ 40.02 & -30\ 06\ 35.7 & -184.7 & 14.3 &  -222.8 &  1.6  &       &         &       &        \\         
  10  & 13.7 & 6.5 & 17\ 59\ 40.38 & -30\ 01\ 13.3 &        &      &    -3.8 &  6.3  &       &         &       &        \\         
  11  & 13.6 & 7.0 & 17\ 59\ 40.36 & -29\ 55\ 03.7 &  -15.5 & 11.1 &   -17.9 &  6.3  &       &         &  1.17 &  -2.85 \\         
  12  & 12.3 & 6.0 & 17\ 59\ 41.66 & -30\ 00\ 54.6 & -174.2 &  8.3 &  -177.8 &  1.5  & 0.491 &    1.61 &       &        \\         
  14  & 13.4 & 6.5 & 17\ 59\ 42.09 & -30\ 05\ 19.8 &   18.2 & 10.7 &    22.1 &  3.4  & 0.318 &    1.35 &       &        \\         
  15  & 12.4 & 6.0 & 17\ 59\ 41.56 & -29\ 54\ 30.4 &   94.1 &  7.4 &    82.3 &  2.8  & 0.300 &    2.43 &       &        \\         
  16  & 13.7 & 5.0 & 17\ 59\ 42.43 & -29\ 57\ 53.1 &        &      &    93.0 &  4.9  &       &         &       &        \\         
  17  & 10.2 & 6.0 & 17\ 59\ 43.92 & -30\ 05\ 43.1 &  -69.2 &  9.2 &   -61.2 &  5.0  & 0.452 &    1.80 &       &        \\         
  18  & 11.0 & 6.0 & 17\ 59\ 44.37 & -30\ 04\ 24.2 &   -1.8 &  8.9 &     4.3 &  3.6  & 0.451 &    1.11 &       &        \\         
  19  & 13.2 & 6.0 & 17\ 59\ 45.14 & -30\ 07\ 29.9 &        &      &  -156.6 &  0.5  & 0.112 &    1.95 &       &        \\         
  20  & 12.0 & 6.0 & 17\ 59\ 44.42 & -29\ 55\ 52.0 & -100.7 &  8.9 &  -112.0 &  3.5  & 0.289 &    2.12 &       &        \\         
  21  & 12.8 & 6.5 & 17\ 59\ 44.61 & -29\ 55\ 57.8 &   52.8 &  9.7 &   113.5 &  1.8  & 0.439 &    1.78 &       &        \\         
  22  & 13.0 & 6.0 & 17\ 59\ 44.52 & -29\ 54\ 50.8 &  -19.4 & 10.7 &     0.6 &  3.5  & 0.334 &    2.08 &       &        \\         
  23  & 13.0 & 6.0 & 17\ 59\ 44.90 & -29\ 59\ 40.1 &        &      &    87.5 &  3.0  &       &         &       &        \\         
  25  & 12.5 & 6.0 & 17\ 59\ 46.88 & -30\ 08\ 30.1 &   61.8 &  7.8 &    59.7 &  0.3  & 0.214 &    2.17 &       &        \\         
  26  & 13.5 & 6.5 & 17\ 59\ 45.51 & -30\ 00\ 00.1 &  -57.3 &  6.9 &         &       &       &         &       &        \\         
  29  & 12.3 & 7.0 & 17\ 59\ 46.65 & -29\ 58\ 05.3 &   95.3 &  8.6 &    88.3 &  3.0  & 0.465 &    1.90 &       &        \\         
  30  & 12.8 & 6.0 & 17\ 59\ 47.46 & -30\ 06\ 41.9 & -225.1 &  9.0 &  -232.6 &  1.3  & 0.294 &    2.21 &       &        \\         
  32  & 13.1 & 7.0 & 17\ 59\ 49.21 & -30\ 06\ 49.7 &  230.9 &  7.3 &         &       &       &         &  1.16 &  -3.28 \\         
  33  & 10.9 & 6.5 & 17\ 59\ 48.63 & -30\ 01\ 48.7 &  -97.7 &  8.9 &  -106.1 &  1.9  & 0.467 &    1.73 &       &        \\         
  34  & 12.3 & 6.0 & 17\ 59\ 48.00 & -29\ 55\ 02.3 & -225.4 &  9.2 &  -225.5 &  0.7  & 0.215 &    2.25 &       &        \\         
  35  & 13.3 & 6.5 & 17\ 59\ 49.22 & -30\ 00\ 07.2 &        &      &    54.3 &  2.2  & 0.434 &    1.75 &       &        \\         
  37  & 11.9 & 6.0 & 17\ 59\ 50.22 & -29\ 56\ 52.6 &   -4.6 &  7.2 &    -7.9 &  3.0  & 0.351 &    1.73 &       &        \\         
  38  & 10.6 & 6.5 & 17\ 59\ 52.14 & -30\ 08\ 59.3 &  125.1 &  6.5 &   119.6 &  3.1  & 0.147 &    1.86 &       &        \\         
  39  & 13.2 & 9.0 & 17\ 59\ 51.00 & -29\ 57\ 36.7 &        &      &    17.5 &  4.9  & 0.507 &    0.50 &  1.18 &  -4.64 \\         
  43  & 13.8 & 7.0 & 17\ 59\ 53.26 & -30\ 03\ 31.2 &        &      &    34.9 &  1.0  &       &         &       &        \\         
  44: & 12.6 & 6.5 & 17\ 59\ 51.73 & -29\ 51\ 43.0 &  252.0 &  8.0 &   247.8 &  1.0  & 0.313 &    2.27 &       &        \\         
  46  & 13.0 & 7.0 & 17\ 59\ 52.98 & -29\ 55\ 22.3 &  -38.3 &  9.1 &   -24.6 &  2.8  & 0.465 &    0.93 &  1.35 &  -4.13 \\         
  47  & 13.2 & 6.5 & 17\ 59\ 52.59 & -29\ 53\ 05.6 &   44.7 &  9.2 &    21.5 &  4.6  & 0.483 &    1.63 &       &        \\         
  48  & 12.5 & 6.0 & 17\ 59\ 53.07 & -29\ 55\ 34.2 &   20.0 &  8.3 &    25.5 &  2.5  & 0.476 &    1.64 &       &        \\         
  50  & 12.8 & 7.0 & 17\ 59\ 54.01 & -29\ 51\ 48.7 &  148.5 &  9.1 &   154.0 &  1.6  & 0.439 &    1.24 &       &        \\         
  51  & 13.6 & 7.0 & 17\ 59\ 54.03 & -29\ 52\ 10.9 &        &      &    78.6 &  3.1  &       &         &       &        \\         
  52  & 12.8 & 9.0 & 17\ 59\ 55.53 & -30\ 00\ 42.4 & -128.1 & 14.1 &         &       &       &         &  1.24 &  -3.92 \\         
  53  & 13.6 & 6.5 & 17\ 59\ 55.72 & -30\ 03\ 37.6 &        &      &  -151.4 &  1.5  & 0.488 &    1.90 &       &        \\         
  54  & 14.5 & 7.0 & 17\ 59\ 56.01 & -30\ 05\ 33.2 &        &      &  -224.3 &  4.3  & 0.619 &    0.49 &  1.55 &  -3.95 \\         
  55  & 13.6 & 8.0 & 17\ 59\ 55.79 & -29\ 57\ 54.6 &   30.3 &  3.9 &    14.2 &  6.1  & 0.508 &    1.15 &  1.30 &  -3.54 \\         
  57  & 12.5 & 6.0 & 17\ 59\ 56.05 & -29\ 56\ 11.2 &   90.3 &  5.1 &    87.3 &  3.0  & 0.169 &    2.32 &       &        \\         
  58  & 12.8 & 6.0 & 17\ 59\ 57.49 & -30\ 01\ 46.0 &   59.1 &  8.1 &    61.2 &  2.9  & 0.303 &    2.22 &       &        \\         
  59  & 13.4 & 6.5 & 17\ 59\ 56.50 & -29\ 52\ 27.0 &        &      &    12.8 &  5.7  &       &         &       &        \\         
  60  & 13.0 & 6.5 & 17\ 59\ 58.96 & -30\ 09\ 30.7 &  213.2 &  8.3 &   198.8 &  2.4  & 0.461 &    1.62 &       &        \\         
  61  & 12.1 & 7.0 & 17\ 59\ 57.56 & -29\ 55\ 13.0 &   51.6 &  7.9 &    51.9 &  2.4  & 0.449 &    1.90 &       &        \\         
  62  & 12.3 & 6.0 & 17\ 59\ 57.16 & -29\ 52\ 40.7 &  -17.9 &  9.4 &   -22.0 &  0.7  & 0.179 &    2.72 &       &        \\         
  63: & 11.7 & 7.0 & 17\ 59\ 59.15 & -29\ 57\ 54.0 &   17.7 &  6.7 &    28.0 &  3.6  & 0.405 &    0.67 &  1.38 &  -3.71 \\         
  64  & 12.7 & 7.0 & 18\ 00\ 00.03 & -30\ 04\ 36.5 &   -5.1 &  8.5 &    16.5 &  3.4  & 0.510 &    1.17 &  1.21 &  -4.02 \\         
\end{tabular}
\end{table}

\clearpage
\setcounter{table}{0}
\begin{table}
\centering

\caption{({\em continued\/})}
\vspace*{0.25in}
\begin{tabular}{rccccrrrrcccc}
\multicolumn{1}{c}{(1)} & (2) & (3) & (4) &   (5) &
\multicolumn{1}{c}{(6)} &
\multicolumn{1}{c}{(7)} &
\multicolumn{1}{c}{(8)} &
\multicolumn{1}{c}{(9)} &
(10) & (11) & (12) & (13) \\[0.5cm]
  65  & 13.4 & 6.5 & 18\ 00\ 01.36 & -30\ 12\ 08.6 &  -49.5 &  9.2 &   -54.1 &  4.5  &       &         &       &        \\         
  66  & 13.4 & 6.5 & 18\ 00\ 01.28 & -30\ 10\ 45.6 &   25.3 &  8.4 &    17.6 &  3.2  & 0.379 &    1.14 &       &        \\         
  67  & 13.5 & 8.0 & 18\ 00\ 00.88 & -30\ 01\ 03.6 &        &      &   169.7 &  3.5  & 0.393 &    0.25 &       &        \\         
  68  & 13.7 & 6.0 & 18\ 00\ 01.34 & -30\ 03\ 13.8 &        &      &    18.1 &  5.2  & 0.361 &    0.71 &  1.13 &  -2.12 \\         
  69  & 13.7 & 7.0 & 18\ 00\ 03.23 & -30\ 10\ 04.8 &        &      &  -172.0 &  2.5  &       &         &       &        \\         
  70  & 13.2 & 6.5 & 18\ 00\ 02.57 & -30\ 07\ 37.4 &  169.0 &  5.9 &   158.1 &  2.3  & 0.398 &    0.61 &       &        \\         
  71: & 12.0 & 6.0 & 18\ 00\ 03.68 & -30\ 11\ 02.4 & -138.5 &  9.3 &  -151.0 &  2.2  & 0.373 &    1.83 &       &        \\         
  73  & 13.4 & 6.5 & 18\ 00\ 02.06 & -30\ 02\ 15.1 &   42.7 &  7.3 &         &       &       &         &       &        \\         
  74  & 13.0 & 6.5 & 18\ 00\ 04.62 & -30\ 11\ 43.8 &   54.7 &  8.4 &    38.7 &  1.4  & 0.390 &    1.26 &       &        \\         
  76: & 13.4 & 7.0 & 18\ 00\ 04.34 & -30\ 01\ 53.6 &        &      &   174.7 &  5.4  & 0.361 &    2.04 &       &        \\         
  77  & 13.3 & 6.5 & 18\ 00\ 03.71 & -29\ 55\ 45.5 &   56.1 & 10.8 &         &       &       &         &       &        \\         
  78  & 11.0 & 5.0 & 18\ 00\ 03.36 & -29\ 51\ 17.5 &  -60.4 &  9.2 &   -58.8 &  6.1  & 0.245 &    2.32 &       &        \\         
  80  & 13.2 & 6.5 & 18\ 00\ 06.72 & -30\ 06\ 54.0 &        &      &   152.5 &  4.0  & 0.408 &    1.15 &       &        \\         
  81  & 13.1 & 6.0 & 18\ 00\ 07.55 & -30\ 10\ 46.4 &   68.1 &  6.5 &    59.2 &  1.7  & 0.203 &    1.86 &       &        \\         
  84  & 13.0 & 6.0 & 18\ 00\ 05.61 & -30\ 03\ 18.9 &        &      &  -155.2 &  1.7  & 0.208 &    2.62 &  1.01 &  -2.42 \\         
  85  & 12.4 & 6.0 & 18\ 00\ 07.83 & -30\ 08\ 55.5 &  -29.4 &  8.7 &   -27.2 &  4.0  & 0.479 &    1.54 &       &        \\         
  86  & 13.4 & 9.0 & 18\ 00\ 06.18 & -29\ 53\ 54.4 & -161.2 & 10.7 &  -157.7 &  5.3  &       &         &  1.38 &  -3.91 \\         
  87  & 12.4 & 8.0 & 18\ 00\ 08.52 & -30\ 12\ 12.9 &        &      &   214.4 &  4.1  &       &         &  1.76 &  -4.28 \\         
  88  & 12.8 & 7.0 & 18\ 00\ 09.02 & -30\ 13\ 05.5 &  -98.6 &  8.3 &   -50.3 &  2.9  & 0.433 &    1.47 &       &        \\         
  89  & 12.1 & 5.0 & 18\ 00\ 07.64 & -29\ 59\ 43.2 & -102.2 &  9.1 &   -90.1 &  0.9  & 0.150 &    2.50 &       &        \\         
  91: & 12.5 & 6.5 & 18\ 00\ 08.07 & -29\ 54\ 40.2 &  153.3 &  8.5 &   172.4 &  2.4  & 0.340 &    2.01 &  1.04 &  -3.10 \\         
  93  & 11.2 & 6.0 & 18\ 00\ 09.88 & -30\ 03\ 04.2 &  -61.1 &  8.5 &   -59.3 &  5.0  & 0.350 &    2.14 &  1.05 &  -4.26 \\         
  94  & 13.3 & 7.0 & 18\ 00\ 10.71 & -30\ 08\ 46.7 &   69.5 &  9.1 &         &       &       &         &       &        \\         
  95  & 13.6 & 6.0 & 18\ 00\ 10.50 & -30\ 03\ 27.7 &   75.2 &  7.1 &         &       &       &         &  1.00 &  -1.96 \\         
  97  & 12.3 & 6.0 & 18\ 00\ 10.10 & -29\ 57\ 28.8 &  -94.8 &  9.2 &   -86.9 &  4.2  & 0.243 &    2.29 &       &        \\         
  98  & 13.2 & 6.0 & 18\ 00\ 12.02 & -30\ 04\ 47.4 &        &      &   -66.9 &  4.9  & 0.294 &    1.90 &  1.04 &  -2.50 \\         
  99  & 12.5 & 6.5 & 18\ 00\ 11.92 & -30\ 04\ 24.3 & -128.2 &  8.5 &  -134.1 &  1.9  & 0.384 &    2.36 &  1.05 &  -3.12 \\         
 100  & 13.7 & 6.0 & 18\ 00\ 12.42 & -30\ 07\ 04.5 &        &      &    82.0 &  3.4  & 0.112 &    1.96 &       &        \\         
 101  & 13.3 & 6.5 & 18\ 00\ 11.58 & -29\ 59\ 33.8 &   65.4 &  8.3 &    57.0 &  4.7  & 0.365 &    1.04 &       &        \\         
 103  & 12.7 & 6.5 & 18\ 00\ 11.60 & -29\ 54\ 18.4 &  -33.4 & 10.0 &   -36.5 &  4.0  & 0.470 &    1.00 &       &        \\         
 104  & 12.6 & 6.0 & 18\ 00\ 11.66 & -29\ 55\ 15.1 &  158.6 &  7.0 &   150.0 &  1.6  & 0.422 &    2.19 &       &        \\         
 105  & 13.3 & 6.5 & 18\ 00\ 11.05 & -29\ 50\ 01.5 &   -5.8 & 16.7 &   -56.3 &  4.2  &       &         &       &        \\         
 106  & 12.7 & 6.0 & 18\ 00\ 12.88 & -29\ 59\ 56.4 &        &      &    72.1 &  1.0  & 0.413 &    1.87 &  1.07 &  -3.11 \\         
 108  & 11.5 & 6.0 & 18\ 00\ 13.47 & -29\ 58\ 55.1 &    7.0 &  7.7 &     3.4 &  4.2  & 0.399 &    1.62 &  1.03 &  -3.92 \\         
 109  & 13.0 & 6.0 & 18\ 00\ 12.90 & -29\ 54\ 47.6 &        &      &   154.4 &  5.7  & 0.371 &    2.23 &       &        \\         
 110  & 13.1 & 6.0 & 18\ 00\ 12.40 & -29\ 52\ 15.4 &        &      &   -83.2 &  5.0  & 0.274 &    2.00 &       &        \\         
 111  & 13.5 & 7.0 & 18\ 00\ 15.48 & -30\ 12\ 04.9 & -133.5 &  7.5 &  -159.9 &  2.4  & 0.480 &    1.50 &  1.19 &  -3.40 \\         
 112  & 13.1 & 6.5 & 18\ 00\ 15.24 & -30\ 09\ 59.7 &        &      &  -121.4 &  1.7  & 0.385 &    1.23 &       &        \\         
 113  & 11.8 & 6.5 & 18\ 00\ 13.73 & -29\ 52\ 37.1 &   56.6 &  7.7 &    53.8 &  2.2  & 0.278 &    2.11 &       &        \\         
 114  & 12.9 & 6.5 & 18\ 00\ 14.84 & -30\ 01\ 11.6 &        &      &  -134.8 &  3.4  & 0.383 &    1.63 &  1.15 &  -3.71 \\         
 115  & 12.9 & 6.0 & 18\ 00\ 15.96 & -30\ 06\ 35.8 &  115.5 &  8.4 &   123.3 &  4.8  & 0.140 &    2.27 &       &        \\         
 116  & 13.3 & 7.0 & 18\ 00\ 17.55 & -30\ 10\ 56.0 &        &      &  -110.6 &  5.1  & 0.350 &    1.14 &  1.14 &  -3.16 \\         
 117  & 13.2 & 7.0 & 18\ 00\ 16.38 & -30\ 02\ 36.0 &        &      &   194.4 &  2.7  & 0.241 &    2.08 &  0.98 &  -2.48 \\         
 118  & 13.5 & 6.0 & 18\ 00\ 17.52 & -30\ 06\ 32.1 &   53.0 &  7.2 &         &       &       &         &       &        \\         
 119: & 13.2 & 9.0 & 18\ 00\ 16.08 & -29\ 55\ 53.4 &        &      &  -119.8 &  4.2  &       &         &       &        \\         
 121  & 13.7 & 6.5 & 18\ 00\ 17.20 & -30\ 01\ 17.2 & -110.3 &  4.2 &  -154.5 &  3.7  & 0.407 &    1.15 &       &        \\         
 122  & 13.1 & 7.0 & 18\ 00\ 19.38 & -30\ 12\ 17.5 &  -71.1 & 10.2 &   -87.2 &  0.2  & 0.580 &    1.96 &  1.10 &  -3.24 \\         
 123  & 13.1 & 7.0 & 18\ 00\ 19.05 & -30\ 08\ 37.5 & -138.9 &  9.1 &  -156.2 &  3.1  & 0.403 &    0.96 &  1.23 &  -3.89 \\         
 124  & 12.3 & 6.0 & 18\ 00\ 18.20 & -30\ 00\ 59.6 &  125.3 &  7.8 &   125.4 &  2.1  & 0.458 &    1.88 &  1.06 &  -3.49 \\         
 125  & 13.3 & 6.5 & 18\ 00\ 17.44 & -29\ 56\ 05.8 &        &      &   148.1 &  0.7  & 0.349 &    1.09 &       &        \\         
\end{tabular}
\end{table}

\clearpage
\setcounter{table}{0}
\begin{table}
\centering

\caption{({\em continued\/})}
\vspace*{0.25in}
\begin{tabular}{rccccrrrrcccc}
\multicolumn{1}{c}{(1)} & (2) & (3) & (4) &   (5) &
\multicolumn{1}{c}{(6)} &
\multicolumn{1}{c}{(7)} &
\multicolumn{1}{c}{(8)} &
\multicolumn{1}{c}{(9)} &
(10) & (11) & (12) & (13) \\[0.5cm]
 126: & 12.2 & 7.0 & 18\ 00\ 17.10 & -29\ 50\ 47.8 &  107.8 &  7.3 &   101.4 &  2.8  & 0.500 &    1.13 &  1.11 &  -3.84 \\         
 127  & 13.2 & 7.0 & 18\ 00\ 18.70 & -29\ 59\ 11.1 &        &      &   -58.4 &  2.0  & 0.411 &    0.91 &  1.14 &  -3.16 \\         
 128  & 12.5 & 7.0 & 18\ 00\ 19.38 & -30\ 06\ 17.4 &  -59.9 &  9.4 &   -66.0 &  3.7  & 0.411 &    2.00 &  1.08 &  -3.55 \\         
 129  & 11.0 & 6.5 & 18\ 00\ 18.80 & -30\ 01\ 10.3 &        &      &    28.6 &  3.0  & 0.465 &    1.63 &  1.08 &  -4.96 \\         
 130  & 13.0 & 6.5 & 18\ 00\ 20.31 & -30\ 13\ 19.0 &        &      &   166.5 &  2.5  & 0.317 &    1.78 &       &        \\         
 131  & 11.7 & 6.0 & 18\ 00\ 19.53 & -30\ 00\ 37.2 &  -22.5 &  8.6 &   -24.2 &  5.2  & 0.303 &    2.24 &  1.02 &  -3.68 \\         
 133  & 12.9 & 6.0 & 18\ 00\ 19.82 & -30\ 04\ 52.7 &        &      &    82.5 &  2.9  & 0.231 &    1.83 &  1.06 &  -2.68 \\         
 135  & 13.1 & 6.5 & 18\ 00\ 20.60 & -30\ 10\ 14.7 &        &      &  -131.7 &  2.6  & 0.265 &    1.77 &       &        \\         
 136  & 12.7 & 8.0 & 18\ 00\ 18.95 & -29\ 53\ 42.4 &        &      &   179.3 &  3.1  & 0.475 &    1.18 &  1.24 &  -3.71 \\         
 138  & 12.8 & 6.0 & 18\ 00\ 21.58 & -30\ 05\ 26.1 &   74.6 &  6.9 &    85.3 &  2.7  & 0.152 &    2.91 &  0.99 &  -2.44 \\         
 140  & 12.9 & 6.5 & 18\ 00\ 20.89 & -29\ 59\ 20.0 &        &      &     6.4 &  3.5  & 0.406 &    1.36 &       &        \\         
 141  & 13.1 & 6.0 & 18\ 00\ 20.52 & -29\ 55\ 24.6 &        &      &     7.4 &  6.8  & 0.364 &    1.90 &       &        \\         
 143  & 12.3 & 6.5 & 18\ 00\ 21.69 & -30\ 01\ 14.0 & -115.9 &  8.4 &  -125.6 &  2.3  & 0.419 &    1.72 &       &        \\         
 144  & 13.9 & 6.5 & 18\ 00\ 23.45 & -30\ 11\ 39.9 &        &      &   -41.7 &  0.9  & 0.357 &    1.20 &       &        \\         
 145  & 12.8 & 6.0 & 18\ 00\ 24.40 & -30\ 13\ 13.5 &   53.0 &  8.6 &    57.7 &  4.0  & 0.187 &    2.37 &       &        \\         
 146  & 12.4 & 6.0 & 18\ 00\ 22.13 & -30\ 01\ 46.6 &   41.7 &  9.2 &    31.3 &  2.3  & 0.380 &    1.75 &       &        \\         
 147  & 12.3 & 6.5 & 18\ 00\ 23.75 & -30\ 06\ 35.6 & -208.8 &  9.1 &  -211.6 &  3.3  & 0.484 &    1.70 &       &        \\         
 150  & 13.4 & 6.5 & 18\ 00\ 23.61 & -29\ 59\ 07.2 &        &      &   -59.3 &  0.9  & 0.303 &    1.56 &  1.04 &  -2.33 \\         
 153  & 10.9 & 6.0 & 18\ 00\ 24.24 & -29\ 53\ 48.2 &  -79.1 &  8.5 &         &       &       &         &  1.12 &  -3.98 \\         
 156  & 13.3 & 6.0 & 18\ 00\ 24.95 & -29\ 55\ 59.8 &        &      &   -55.8 &  2.3  &       &         &       &        \\         
 157  & 13.3 & 6.0 & 18\ 00\ 26.82 & -30\ 10\ 58.5 &  -35.7 &  7.9 &   -37.9 &  2.0  & 0.088 &    2.17 &       &        \\         
 158  & 12.8 & 6.5 & 18\ 00\ 25.47 & -30\ 03\ 00.1 &    6.1 &  8.6 &    13.8 &  4.5  & 0.088 &    2.49 &       &        \\         
 159  & 12.3 & 6.5 & 18\ 00\ 27.08 & -30\ 10\ 07.4 &  209.6 &  7.1 &   209.8 &  0.6  & 0.269 &    2.38 &       &        \\         
 160  & 13.1 & 6.5 & 18\ 00\ 27.50 & -30\ 06\ 52.2 &        &      &  -144.9 &  2.8  & 0.056 &    2.27 &       &        \\         
 161  & 12.9 & 6.5 & 18\ 00\ 28.89 & -30\ 08\ 36.4 &  130.5 &  8.7 &   122.9 &  0.2  & 0.385 &    1.96 &       &        \\         
 162  & 12.5 & 6.5 & 18\ 00\ 30.48 & -30\ 08\ 03.4 &   94.6 &  7.2 &    96.8 &  2.7  & 0.407 &    1.62 &       &        \\         
 163  & 13.1 & 6.0 & 18\ 00\ 30.72 & -30\ 06\ 59.2 &  -87.9 &  9.0 &         &       &       &         &       &        \\         
 164  & 13.6 & 6.5 & 18\ 00\ 29.88 & -29\ 57\ 18.8 &        &      &    20.5 &  2.9  & 0.358 &    2.25 &       &        \\         
 168  & 12.8 & 6.0 & 18\ 00\ 32.15 & -30\ 08\ 42.6 &        &      &   129.0 &  5.4  & 0.172 &    2.69 &       &        \\         
 169  & 12.7 & 7.0 & 18\ 00\ 29.06 & -29\ 49\ 07.0 & -155.9 & 12.4 &         &       &       &         &  1.10 &  -3.20 \\         
 170  & 13.3 & 7.0 & 18\ 00\ 31.85 & -30\ 03\ 52.6 &  -86.5 & 10.8 &         &       &       &         &  1.08 &  -2.61 \\         
 171  & 11.3 & 6.0 & 18\ 00\ 31.54 & -30\ 02\ 30.7 & -152.7 &  9.2 &  -164.5 &  2.2  & 0.396 &    1.90 &  1.08 &  -4.20 \\         
 174  & 13.2 & 6.0 & 18\ 00\ 33.00 & -30\ 04\ 42.9 &  -74.4 &  9.8 &         &       &       &         &  0.99 &  -2.16 \\         
 176  & 11.8 & 6.0 & 18\ 00\ 33.74 & -30\ 02\ 34.2 & -280.9 &  9.2 &  -284.6 &  2.8  & 0.503 &    1.60 &  1.12 &  -4.20 \\         
 177  & 12.9 & 6.5 & 18\ 00\ 34.17 & -30\ 02\ 37.0 &  -44.8 &  8.6 &   -27.6 &  0.4  & 0.158 &    2.72 &  1.03 &  -2.43 \\         
 178  & 13.2 & 6.5 & 18\ 00\ 35.30 & -30\ 12\ 43.2 &        &      &   -82.6 &  4.4  & 0.403 &    1.25 &       &        \\         
 179  & 12.8 & 7.0 & 18\ 00\ 33.69 & -29\ 59\ 22.1 &        &      &   -51.6 &  3.2  & 0.572 &    0.80 &  1.33 &  -4.32 \\         
 180  & 12.8 & 6.5 & 18\ 00\ 35.00 & -30\ 03\ 46.9 &        &      &   208.2 &  1.1  & 0.241 &    1.71 &  1.04 &  -2.80 \\         
 181  & 10.2 & 7.0 & 18\ 00\ 33.65 & -29\ 54\ 52.2 &        &      &    12.4 &  4.6  & 0.453 &    1.61 &  1.08 &  -5.83 \\         
 184  & 13.3 & 6.0 & 18\ 00\ 36.62 & -30\ 09\ 41.2 &   63.5 &  6.8 &         &       &       &         &       &        \\         
 185  & 13.8 & 6.0 & 18\ 00\ 37.10 & -30\ 12\ 57.5 &        &      &    14.0 &  1.3  & 0.459 &    2.31 &       &        \\         
 186  & 12.1 & 6.5 & 18\ 00\ 36.14 & -29\ 59\ 56.7 &   55.6 &  8.6 &    46.8 &  2.9  & 0.437 &    1.73 &       &        \\         
 188  & 13.0 & 7.0 & 18\ 00\ 37.94 & -30\ 10\ 12.6 &        &      &    16.5 &  3.3  & 0.431 &    2.50 &  1.05 &  -2.79 \\         
 189  & 13.2 & 6.5 & 18\ 00\ 35.56 & -29\ 49\ 37.7 &        &      &   -77.9 &  4.7  & 0.306 &    0.86 &       &        \\         
 190  & 13.7 & 6.5 & 18\ 00\ 38.41 & -30\ 06\ 49.8 &        &      &    22.1 &  2.4  & 0.068 &    1.90 &       &        \\         
 191  & 13.3 & 6.0 & 18\ 00\ 38.90 & -30\ 09\ 46.7 &   99.5 &  3.4 &         &       &       &         &       &        \\         
 192  & 13.7 & 8.0 & 18\ 00\ 38.74 & -30\ 07\ 53.8 &        &      &    -4.2 &  3.3  & 0.559 &    0.56 &  1.39 &  -3.84 \\         
 193  & 13.5 & 6.5 & 18\ 00\ 39.45 & -30\ 10\ 27.7 &  -30.1 &  9.8 &         &       &       &         &       &        \\         
 195: & 12.5 & 6.0 & 18\ 00\ 40.13 & -30\ 05\ 28.5 &  130.3 &  8.3 &   130.9 &  1.1  & 0.267 &    2.43 &       &        \\         
 196  & 12.6 & 6.0 & 18\ 00\ 40.97 & -30\ 10\ 26.6 &  -83.5 &  8.2 &   -86.5 &  2.3  & 0.257 &    2.21 &       &        \\         
\end{tabular}
\end{table}

\clearpage
\setcounter{table}{0}
\begin{table}
\centering

\caption{({\em continued\/})}
\vspace*{0.25in}
\begin{tabular}{rccccrrrrcccc}
\multicolumn{1}{c}{(1)} & (2) & (3) & (4) &   (5) &
\multicolumn{1}{c}{(6)} &
\multicolumn{1}{c}{(7)} &
\multicolumn{1}{c}{(8)} &
\multicolumn{1}{c}{(9)} &
(10) & (11) & (12) & (13) \\[0.5cm]
 197  & 13.0 & 7.0 & 18\ 00\ 40.93 & -30\ 07\ 13.9 &        &      &    46.9 &  2.7  & 0.505 &    1.35 &  1.20 &  -3.56 \\         
 199  & 12.8 & 6.0 & 18\ 00\ 38.64 & -29\ 49\ 54.3 &        &      &  -181.1 &  2.4  & 0.153 &    2.31 &       &        \\         
 200  & 12.6 & 5.0 & 18\ 00\ 40.25 & -30\ 01\ 33.8 &        &      &  -116.4 &  2.0  & 0.083 &    2.38 &  0.99 &  -2.57 \\         
 201  & 12.8 & 6.5 & 18\ 00\ 42.64 & -30\ 12\ 44.5 &   11.8 &  8.3 &    39.5 &  1.1  &       &         &       &        \\         
 202: & 12.8 & 6.5 & 18\ 00\ 39.83 & -29\ 51\ 41.4 &        &      &    79.1 &  1.9  & 0.392 &    1.09 &       &        \\         
 203  & 13.0 & 6.5 & 18\ 00\ 40.50 & -29\ 53\ 14.3 &        &      &  -159.2 &  2.5  & 0.359 &    1.65 &       &        \\         
 204  & 12.2 & 6.0 & 18\ 00\ 40.62 & -29\ 52\ 19.0 &   59.9 &  8.4 &    76.5 &  2.4  & 0.208 &    2.16 &       &        \\         
 205  & 13.5 & 8.0 & 18\ 00\ 42.46 & -30\ 04\ 31.3 &        &      &    75.7 &  2.3  & 0.352 &    0.61 &  1.28 &  -3.62 \\         
 206  & 12.8 & 6.0 & 18\ 00\ 42.81 & -30\ 08\ 23.8 &   56.3 &  9.1 &    69.4 &  1.5  & 0.153 &    2.47 &       &        \\         
 207  & 11.9 & 6.0 & 18\ 00\ 43.02 & -30\ 08\ 20.1 & -189.4 &  9.8 &  -188.3 &  6.0  & 0.372 &    2.01 &       &        \\         
 209  & 12.1 & 6.5 & 18\ 00\ 44.70 & -30\ 12\ 47.5 & -120.3 &  6.7 &  -117.6 &  0.2  & 0.114 &    2.03 &       &        \\         
 210  & 14.1 & 7.0 & 18\ 00\ 42.77 & -30\ 02\ 00.2 &        &      &  -130.6 &  4.1  & 0.419 &    0.53 &       &        \\         
 211  & 12.5 & 6.0 & 18\ 00\ 45.47 & -30\ 11\ 27.3 & -143.8 &  8.4 &  -143.3 &  1.1  & 0.264 &    2.38 &       &        \\         
 212  & 12.1 & 6.0 & 18\ 00\ 43.08 & -29\ 58\ 05.3 &  246.6 &  6.8 &   248.9 &  2.8  & 0.143 &    2.63 &  1.00 &  -3.00 \\         
 213  & 13.3 & 6.0 & 18\ 00\ 44.40 & -30\ 00\ 27.3 &  137.7 &  6.0 &         &       &       &         &       &        \\         
 214  & 12.3 & 7.0 & 18\ 00\ 43.23 & -29\ 49\ 53.1 &        &      &  -219.1 &  1.1  & 0.446 &    2.00 &       &        \\         
 217  & 12.4 & 6.5 & 18\ 00\ 47.38 & -30\ 11\ 10.8 &  193.0 &  7.4 &   187.5 &  1.6  & 0.444 &    1.80 &       &        \\         
 218  & 12.4 & 6.0 & 18\ 00\ 46.27 & -30\ 00\ 18.6 & -148.5 &  8.3 &  -164.1 &  1.3  & 0.413 &    1.87 &       &        \\         
 219  & 13.8 & 6.0 & 18\ 00\ 45.61 & -29\ 52\ 54.3 &        &      &    67.4 &  3.5  &       &         &       &        \\         
 220  & 12.6 & 8.0 & 18\ 00\ 45.72 & -29\ 52\ 42.8 &  -67.1 &  8.4 &   -63.9 &  3.2  & 0.393 &    0.83 &  1.25 &  -4.04 \\         
 221  & 13.2 & 6.0 & 18\ 00\ 45.38 & -29\ 50\ 12.6 &        &      &  -111.6 &  1.6  &       &         &       &        \\         
 222  & 11.8 & 6.0 & 18\ 00\ 47.35 & -30\ 03\ 28.4 &  -26.8 &  6.9 &         &       &       &         &       &        \\         
 223  & 13.3 & 6.0 & 18\ 00\ 46.91 & -29\ 58\ 50.3 &        &      &   163.8 &  2.1  & 0.241 &    2.03 &       &        \\         
 224  & 14.0 & 6.0 & 18\ 00\ 46.44 & -29\ 56\ 31.3 &        &      &   159.7 &  3.4  & 0.317 &    1.58 &       &        \\         
 226  & 13.7 & 7.0 & 18\ 00\ 48.85 & -30\ 07\ 17.0 &        &      &   -14.6 &  2.0  & 0.417 &    0.73 &       &        \\         
 227  & 13.0 & 6.5 & 18\ 00\ 49.12 & -30\ 06\ 36.4 &  -97.6 &  9.1 &  -122.7 &  1.6  & 0.278 &    2.35 &       &        \\         
 228  & 11.8 & 6.0 & 18\ 00\ 48.92 & -30\ 02\ 33.9 &    6.6 &  7.3 &     2.5 &  4.6  & 0.244 &    2.14 &  1.05 &  -3.70 \\         
 229  & 13.4 & 6.5 & 18\ 00\ 48.45 & -29\ 56\ 58.4 &  186.3 &  5.2 &   150.1 &  1.1  & 0.334 &    1.47 &       &        \\         
 230  & 13.3 & 6.5 & 18\ 00\ 48.44 & -29\ 55\ 13.8 &        &      &  -145.0 &  2.0  & 0.501 &    1.73 &       &        \\         
 232  & 13.8 & 6.0 & 18\ 00\ 49.10 & -29\ 53\ 39.5 &        &      &   148.0 &  5.7  & 0.441 &    2.70 &       &        \\         
 234  & 10.4 & 6.0 & 18\ 00\ 49.49 & -29\ 53\ 13.7 &   59.8 &  8.9 &    53.0 &  2.4  & 0.436 &    1.97 &       &        \\         
 236  & 13.0 & 6.5 & 18\ 00\ 52.19 & -30\ 06\ 45.7 &        &      &    51.5 &  4.4  & 0.352 &    1.72 &       &        \\         
 237  & 13.2 & 7.0 & 18\ 00\ 50.38 & -29\ 51\ 55.6 &   42.3 &  7.1 &    20.3 &  3.9  & 0.430 &    1.08 &       &        \\         
 238  & 13.1 & 6.5 & 18\ 00\ 50.26 & -29\ 50\ 42.0 &    3.7 &  8.5 &    20.4 &  6.8  & 0.398 &    0.25 &       &        \\         
 240  & 12.8 & 6.5 & 18\ 00\ 50.71 & -29\ 50\ 41.2 &   49.1 &  7.5 &    63.1 &  2.1  & 0.370 &    1.41 &       &        \\         
 242  & 13.0 & 7.0 & 18\ 00\ 51.16 & -29\ 51\ 27.6 &  -36.0 &  9.5 &   -22.4 &  3.6  & 0.457 &    1.06 &       &        \\         
 245  & 12.5 & 5.0 & 18\ 00\ 53.75 & -30\ 11\ 00.7 &  -47.4 &  8.8 &   -42.9 &  2.0  & 0.157 &    2.84 &       &        \\         
 247  & 13.5 & 8.0 & 18\ 00\ 52.83 & -29\ 58\ 57.0 &   24.9 &  9.2 &    14.8 &  4.5  & 0.385 &    0.56 &  1.26 &  -3.42 \\         
 248  & 13.4 & 8.0 & 18\ 00\ 51.65 & -29\ 53\ 16.5 &        &      &   188.8 &  3.2  & 0.407 &    0.29 &  1.28 &  -3.62 \\         
 249  & 13.3 & 6.0 & 18\ 00\ 51.59 & -29\ 52\ 33.5 &   -1.4 & 10.3 &   -13.8 &  4.7  & 0.157 &    2.73 &       &        \\         
 250  & 14.3 & 7.0 & 18\ 00\ 52.45 & -29\ 52\ 03.9 &        &      &   -16.4 &  6.1  & 0.494 &    0.31 &  2.66 &  -3.64 \\         
 251  & 12.2 & 6.0 & 18\ 00\ 53.50 & -29\ 54\ 02.3 &  -59.9 &  8.6 &   -56.9 &  4.1  & 0.280 &    2.30 &       &        \\         
 252  & 13.2 & 6.0 & 18\ 00\ 54.45 & -30\ 00\ 16.0 &  159.3 &  7.2 &   176.3 &  5.6  & 0.201 &    2.66 &       &        \\         
 253  & 12.9 & 6.0 & 18\ 00\ 55.02 & -30\ 01\ 05.0 &  105.1 &  7.7 &   107.3 &  1.3  & 0.192 &    2.35 &       &        \\         
 254  & 12.6 & 6.0 & 18\ 00\ 56.64 & -30\ 09\ 16.0 &   65.8 &  8.6 &    62.1 &  0.7  & 0.136 &    3.00 &       &        \\         
 255  & 13.7 & 6.0 & 18\ 00\ 56.34 & -30\ 05\ 31.4 &        &      &   -58.3 &  0.2  & 0.191 &    1.79 &       &        \\         
 256  & 12.4 & 6.0 & 18\ 00\ 55.30 & -29\ 57\ 36.5 &  -84.2 &  7.8 &   -87.0 &  0.7  & 0.165 &    2.72 &       &        \\         
 257  & 12.3 & 6.0 & 18\ 00\ 55.17 & -29\ 56\ 51.5 &  160.0 &  8.5 &   145.6 &  3.0  & 0.382 &    1.76 &       &        \\         
 258  & 12.6 & 6.0 & 18\ 00\ 55.84 & -29\ 58\ 34.4 &  237.0 &  8.1 &   226.6 &  1.2  & 0.266 &    2.47 &       &        \\         
 259  & 12.0 & 6.0 & 18\ 00\ 54.76 & -29\ 54\ 22.4 &  142.5 &  6.5 &   111.4 &  0.7  & 0.350 &    1.92 &       &        \\         
\end{tabular}
\end{table}

\clearpage
\setcounter{table}{0}
\begin{table}
\centering

\caption{({\em continued\/})}
\vspace*{0.25in}
\begin{tabular}{rccccrrrrcccc}
\multicolumn{1}{c}{(1)} & (2) & (3) & (4) &   (5) &
\multicolumn{1}{c}{(6)} &
\multicolumn{1}{c}{(7)} &
\multicolumn{1}{c}{(8)} &
\multicolumn{1}{c}{(9)} &
(10) & (11) & (12) & (13) \\[0.5cm]
 261  & 13.3 & 7.0 & 18\ 00\ 59.57 & -30\ 09\ 16.8 &  -52.0 &  9.9 &   -69.1 &  3.6  & 0.431 &    1.07 &       &        \\         
 262  & 12.4 & 6.0 & 18\ 00\ 59.42 & -30\ 02\ 10.7 & -218.5 &  9.4 &  -215.6 &  0.3  & 0.291 &    2.74 &       &        \\         
 263  & 12.8 & 7.0 & 18\ 00\ 59.95 & -29\ 57\ 25.6 &   93.0 &  9.3 &   100.2 &  1.4  & 0.154 &    2.30 &       &        \\         
 264  & 13.5 & 6.5 & 18\ 01\ 00.59 & -29\ 59\ 20.6 &        &      &    89.4 &  2.4  & 0.265 &    1.81 &       &        \\         
 265  & 13.1 & 6.0 & 18\ 01\ 00.75 & -29\ 59\ 05.9 &    9.4 &  8.8 &         &       &       &         &       &        \\         
 266  & 13.9 & 7.0 & 18\ 01\ 01.96 & -30\ 07\ 47.3 &        &      &   -69.8 &  1.8  & 0.362 &    0.61 &       &        \\         
 267  & 12.6 & 6.5 & 18\ 01\ 00.42 & -29\ 51\ 33.6 &   56.8 &  8.2 &    33.7 &  2.2  & 0.285 &    2.07 &       &        \\         
 268  & 13.5 & 7.0 & 18\ 01\ 00.64 & -29\ 54\ 37.2 &  101.0 &  5.8 &    57.5 &  2.3  & 0.416 &    1.44 &       &        \\         
 269  & 12.9 & 9.0 & 18\ 01\ 01.11 & -29\ 55\ 40.3 &  104.3 &  8.5 &   123.9 &  2.3  & 0.397 &    1.20 &  1.23 &  -3.64 \\         
 270  & 13.3 & 7.0 & 18\ 01\ 02.19 & -30\ 02\ 08.3 &        &      &   -10.9 &  2.4  & 0.361 &    0.58 &       &        \\         
 271  & 13.3 & 6.0 & 18\ 01\ 02.91 & -30\ 06\ 44.8 & -186.5 &  9.0 &  -179.1 &  1.0  & 0.174 &    2.47 &       &        \\         
 272  & 13.5 & 6.5 & 18\ 01\ 04.04 & -30\ 08\ 23.2 &  -35.1 &  9.9 &   -36.6 &  3.3  & 0.386 &    0.73 &       &        \\         
 273  & 12.7 & 6.0 & 18\ 01\ 04.55 & -30\ 07\ 26.1 &  -10.0 &  7.9 &   -16.7 &  0.9  & 0.312 &    2.14 &       &        \\         
 275  & 13.4 & 6.0 & 18\ 01\ 03.80 & -29\ 55\ 28.0 &        &      &   -44.1 &  3.0  & 0.229 &    1.90 &       &        \\         
 277  & 13.5 & 7.0 & 18\ 01\ 02.62 & -29\ 51\ 59.6 &   91.1 &  4.5 &    71.8 &  6.0  & 0.344 &    1.22 &       &        \\         
 279  & 12.2 & 6.0 & 18\ 01\ 05.61 & -29\ 57\ 28.3 &  -64.8 &  8.0 &   -70.3 &  4.5  & 0.330 &    2.22 &       &        \\         
 280  & 12.1 & 6.0 & 18\ 01\ 08.14 & -30\ 08\ 09.6 &  -54.7 &  9.6 &   -42.8 &  0.1  & 0.245 &    2.35 &       &        \\         
 281  & 13.5 & 6.5 & 18\ 01\ 08.10 & -30\ 07\ 05.2 &  -46.8 & 10.4 &         &       &       &         &       &        \\         
 282  & 13.3 & 6.0 & 18\ 01\ 07.00 & -29\ 59\ 32.4 &        &      &    19.6 &  3.8  & 0.195 &    1.67 &       &        \\         
 284  & 13.5 & 6.5 & 18\ 01\ 09.12 & -29\ 59\ 45.9 & -129.6 & 10.6 &  -172.4 &  3.2  & 0.399 &    1.14 &       &        \\         
 286  & 12.5 & 6.0 & 18\ 01\ 10.06 & -30\ 01\ 05.5 &  128.7 &  7.4 &   132.1 &  0.3  & 0.328 &    1.62 &       &        \\         
 287  & 13.4 & 6.5 & 18\ 01\ 09.14 & -29\ 54\ 59.5 &  196.1 &  7.8 &         &       &       &         &       &        \\         
 288  & 12.8 & 6.5 & 18\ 01\ 10.69 & -30\ 00\ 35.2 &  -77.8 &  8.7 &   -90.1 &  2.9  & 0.391 &    2.28 &       &        \\         
 289  & 12.1 & 9.0 & 18\ 01\ 10.41 & -29\ 55\ 04.0 &  -74.1 &  8.8 &   -67.7 &  3.6  & 0.517 &    0.49 &  1.37 &  -5.07 \\         
 290  & 12.7 & 6.0 & 18\ 01\ 12.03 & -30\ 01\ 59.8 &        &      &    76.6 &  2.2  & 0.177 &    2.04 &       &        \\         
 291  & 12.8 & 7.0 & 18\ 01\ 11.40 & -30\ 00\ 25.2 & -150.3 &  8.3 &  -147.7 &  2.4  & 0.386 &    1.49 &       &        \\         
 293  & 13.4 & 6.0 & 18\ 01\ 12.50 & -30\ 03\ 05.4 &        &      &    29.3 &  2.9  & 0.188 &    2.12 &       &        \\         
 295  & 12.7 & 6.5 & 18\ 01\ 11.60 & -29\ 56\ 28.4 & -119.9 &  7.9 &  -119.6 &  0.9  & 0.292 &    2.19 &       &        \\         
 296  & 12.1 & 5.0 & 18\ 01\ 11.29 & -29\ 54\ 50.6 & -180.9 &  7.2 &  -195.1 &  0.0  & 0.169 &    2.06 &       &        \\         
 297  & 13.2 & 8.0 & 18\ 01\ 12.62 & -29\ 57\ 44.6 &        &      &    94.8 &  2.5  & 0.550 &    1.20 &       &        \\         
 298  & 12.0 & 7.0 & 18\ 01\ 13.13 & -29\ 59\ 22.8 &  -22.6 &  9.1 &   -24.7 &  4.6  & 0.451 &    1.65 &       &        \\         
 299  & 12.6 & 6.5 & 18\ 01\ 14.21 & -30\ 00\ 48.4 &   48.1 &  9.6 &    35.7 &  1.3  & 0.311 &    2.30 &       &        \\         
 300  & 12.2 & 6.5 & 18\ 01\ 14.76 & -30\ 03\ 10.1 & -152.6 &  9.3 &  -152.1 &  4.5  & 0.306 &    2.45 &       &        \\         
 301  & 13.0 & 8.0 & 18\ 01\ 15.11 & -30\ 05\ 07.3 &        &      &   112.3 &  3.0  & 0.350 &    0.38 &  1.32 &  -4.04 \\         
 302  & 13.0 & 6.0 & 18\ 01\ 16.67 & -30\ 04\ 05.2 &  -36.1 &  5.2 &   -15.4 &  6.3  & 0.186 &    2.84 &       &        \\         
 303  & 13.2 & 6.5 & 18\ 01\ 16.70 & -30\ 00\ 28.0 &        &      &    76.9 &  0.9  & 0.372 &    1.61 &       &        \\         
 304  & 12.8 & 6.5 & 18\ 01\ 17.62 & -30\ 02\ 12.0 &   28.1 &  8.2 &    20.3 &  2.9  & 0.385 &    1.38 &       &        \\         
 305  & 12.6 & 6.0 & 18\ 01\ 18.35 & -30\ 02\ 57.0 &  128.3 &  9.1 &   135.7 &  4.5  & 0.188 &    2.49 &       &        \\         
 306  & 12.4 & 7.0 & 18\ 01\ 19.75 & -29\ 58\ 21.8 &   89.6 &  7.4 &   101.6 &  2.7  & 0.408 &    1.19 &       &        \\         
\end{tabular}
\end{table}

\end{document}
